χ 1 2 3 4 5 67 10 20 30

0.03

0.04

0.05 < 3.7 TeV_{jj}3.4 < m

χ 1 2 3 4 5 67 10 20 30

0.03

0.04

0.05 < 4.0 TeV jj 3.7 < m χ

1 2 3 4 5 67 10 20 30

0.03

0.04

0.05 < 4.3 TeVjj4.0 < m

χ 1 2 3 4 5 67 10 20 30

0.03

0.04

0.05 < 4.6 TeV jj 4.3 < m χ 1 2 3 4 5 67 10 20 30

0.04

0.06 < 4.9 TeV_{jj}4.6 < m

χ 1 2 3 4 5 67 10 20 30

0.04

0.06 < 5.4 TeV jj 4.9 < m

Data SM =22 TeV Λ 1,-=_{LL}ηCI

=15 TeV Λ 1,+=_{LL}ηCI Theoretical uncert. Total uncertainty χ 1 2 3 4 56 10 20 30 χ 1/N dN/d

0.04

0.06

> 5.4 TeV jjm ATLAS -1 =13 TeV, 37.0 fb s