Muons in zirconium (Zr)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
40 (Zr) 91.224(2)  6.506  393.0 0.07177 3.4533 0.2957 3.4890 5.1774  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.913  4.913  1.154 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.877  3.877  2.080 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.060  3.060  3.840 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.399  2.399  7.580 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.061  2.061  1.211 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.568  1.568  3.503 × 10^{1}
100. MeV 1.764 × 10^{2} 1.480  1.480  4.819 × 10^{1}
140. MeV 2.218 × 10^{2} 1.395  1.395  7.615 × 10^{1}
200. MeV 2.868 × 10^{2} 1.355  1.355  1.199 × 10^{2}
247. MeV 3.366 × 10^{2} 1.349  1.349 Minimum ionization
300. MeV 3.917 × 10^{2} 1.353  0.000  0.000  1.353  1.940 × 10^{2}
400. MeV 4.945 × 10^{2} 1.371  0.000  0.000  1.372  2.674 × 10^{2}
800. MeV 8.995 × 10^{2} 1.456  0.001  0.000  1.457  5.500 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.490  0.001  0.000  1.491  6.857 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.543  0.001  0.000  0.001  1.546  9.489 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.601  0.002  0.001  0.001  1.606  1.329 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.666  0.004  0.003  0.001  1.674  1.938 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.711  0.006  0.005  0.002  1.723  2.527 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.812  0.015  0.014  0.003  1.844  4.762 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.842  0.019  0.020  0.004  1.886  5.834 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.885  0.029  0.032  0.006  1.953  7.917 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.928  0.046  0.053  0.008  2.035  1.092 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.974  0.075  0.092  0.012  2.153  1.570 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.005  0.105  0.135  0.015  2.261  2.023 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.074  0.238  0.323  0.030  2.665  3.649 × 10^{4}
100. GeV 1.001 × 10^{5} 2.095  0.308  0.425  0.037  2.865  4.373 × 10^{4}
140. GeV 1.401 × 10^{5} 2.126  0.453  0.634  0.052  3.264  5.680 × 10^{4}
200. GeV 2.001 × 10^{5} 2.158  0.678  0.965  0.073  3.875  7.366 × 10^{4}
248. GeV 2.478 × 10^{5} 2.177  0.860  1.226  0.091  4.355 Muon critical energy
300. GeV 3.001 × 10^{5} 2.194  1.065  1.519  0.110  4.889  9.659 × 10^{4}
400. GeV 4.001 × 10^{5} 2.220  1.464  2.093  0.146  5.925  1.151 × 10^{5}
800. GeV 8.001 × 10^{5} 2.283  3.113  4.450  0.296  10.143  1.662 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.303  3.961  5.656  0.372  12.293  1.841 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.334  5.662  8.062  0.527  16.586  2.120 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.368  8.264  11.736  0.762  23.130  2.425 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.406  12.610  17.840  1.165  34.022  2.779 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.434  17.015  24.011  1.575  45.036  3.034 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.502  34.786  48.822  3.274  89.385  3.652 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.524  43.744  61.296  4.146 111.711  3.852 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.558  61.612  86.183  5.938 156.292  4.153 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.595  88.578 123.676  8.684 223.534  4.473 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.638 133.470 186.060  13.431 335.599  4.835 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.668 178.530 248.596  18.291 448.086  5.092 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.744 359.067 498.925  38.592 899.329  5.710 × 10^{5}
100. TeV 1.000 × 10^{8} 2.769 449.500 624.210  49.080 1125.560  5.908 × 10^{5}