Muons in zinc (Zn)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
30 (Zn) 65.38(2)  7.133  330.0 0.14714 2.8652 0.0049 3.3668 4.6906  0.08
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.291  5.291  1.068 × 10^{0}
14.0 MeV 5.616 × 10^{1} 4.168  4.168  1.928 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.284  3.284  3.567 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.569  2.569  7.057 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.204  2.204  1.129 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.665  1.665  3.281 × 10^{1}
100. MeV 1.764 × 10^{2} 1.568  1.568  4.522 × 10^{1}
140. MeV 2.218 × 10^{2} 1.472  1.472  7.167 × 10^{1}
200. MeV 2.868 × 10^{2} 1.422  1.422  1.133 × 10^{2}
267. MeV 3.577 × 10^{2} 1.411  0.000  1.411 Minimum ionization
300. MeV 3.917 × 10^{2} 1.413  0.000  0.000  1.413  1.840 × 10^{2}
400. MeV 4.945 × 10^{2} 1.428  0.000  0.000  1.429  2.544 × 10^{2}
800. MeV 8.995 × 10^{2} 1.510  0.001  0.000  1.511  5.265 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.544  0.001  0.000  1.546  6.573 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.599  0.001  0.000  0.001  1.601  9.113 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.658  0.002  0.001  0.001  1.662  1.279 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.726  0.003  0.002  0.001  1.733  1.867 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.773  0.005  0.004  0.002  1.784  2.435 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.880  0.012  0.012  0.003  1.907  4.596 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.912  0.016  0.016  0.004  1.949  5.633 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.959  0.024  0.026  0.006  2.015  7.650 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.005  0.037  0.043  0.008  2.093  1.057 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.054  0.060  0.075  0.012  2.201  1.522 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.087  0.085  0.109  0.016  2.297  1.967 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.160  0.192  0.262  0.031  2.645  3.587 × 10^{4}
100. GeV 1.001 × 10^{5} 2.182  0.248  0.344  0.038  2.813  4.320 × 10^{4}
140. GeV 1.401 × 10^{5} 2.215  0.365  0.513  0.053  3.147  5.664 × 10^{4}
200. GeV 2.001 × 10^{5} 2.249  0.547  0.782  0.075  3.654  7.432 × 10^{4}
300. GeV 3.001 × 10^{5} 2.287  0.859  1.232  0.113  4.491  9.897 × 10^{4}
311. GeV 3.106 × 10^{5} 2.290  0.892  1.281  0.117  4.581 Muon critical energy
400. GeV 4.001 × 10^{5} 2.314  1.181  1.699  0.150  5.345  1.194 × 10^{5}
800. GeV 8.001 × 10^{5} 2.379  2.515  3.617  0.304  8.815  1.771 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.401  3.201  4.599  0.382  10.582  1.977 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.433  4.577  6.559  0.541  14.110  2.304 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.468  6.683  9.552  0.782  19.486  2.664 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.508  10.204  14.526  1.196  28.435  3.087 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.537  13.773  19.556  1.617  37.485  3.392 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.608  28.179  39.784  3.364  73.936  4.138 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.632  35.443  49.955  4.262  92.293  4.379 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.668  49.934  70.247  6.106 128.955  4.744 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.706  71.808 100.822  8.934 184.271  5.132 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.751 108.223 151.694  13.826 276.494  5.572 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.783 144.781 202.694  18.836 369.095  5.884 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.862 291.272 406.851  39.777 740.762  6.633 × 10^{5}
100. TeV 1.000 × 10^{8} 2.888 364.660 509.030  50.600 927.179  6.874 × 10^{5}