Muons in yttrium (Y)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
39 (Y) 88.90584(2) 4.469  379.0 0.07138 3.4585 0.3608 3.5542 5.4801  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.947  4.947  1.145 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.903  3.903  2.064 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.080  3.080  3.814 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.413  2.414  7.531 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.074  2.074  1.203 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.578  1.578  3.481 × 10^{1}
100. MeV 1.764 × 10^{2} 1.490  1.490  4.789 × 10^{1}
140. MeV 2.218 × 10^{2} 1.405  1.405  7.566 × 10^{1}
200. MeV 2.868 × 10^{2} 1.365  1.365  1.191 × 10^{2}
246. MeV 3.356 × 10^{2} 1.359  1.360 Minimum ionization
300. MeV 3.917 × 10^{2} 1.364  0.000  0.000  1.364  1.926 × 10^{2}
400. MeV 4.945 × 10^{2} 1.383  0.000  0.000  1.384  2.654 × 10^{2}
800. MeV 8.995 × 10^{2} 1.471  0.001  0.000  1.472  5.454 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.505  0.001  0.000  1.507  6.796 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.560  0.001  0.000  0.001  1.563  9.400 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.620  0.002  0.001  0.001  1.624  1.316 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.686  0.004  0.003  0.001  1.694  1.918 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.731  0.006  0.005  0.002  1.744  2.500 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.834  0.014  0.014  0.003  1.866  4.709 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.865  0.019  0.020  0.004  1.908  5.769 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.909  0.029  0.032  0.006  1.975  7.828 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.953  0.045  0.052  0.008  2.057  1.080 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.999  0.073  0.090  0.012  2.174  1.553 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.030  0.103  0.132  0.015  2.281  2.002 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.099  0.233  0.316  0.030  2.679  3.617 × 10^{4}
100. GeV 1.001 × 10^{5} 2.121  0.301  0.415  0.037  2.875  4.337 × 10^{4}
140. GeV 1.401 × 10^{5} 2.152  0.442  0.620  0.052  3.267  5.642 × 10^{4}
200. GeV 2.001 × 10^{5} 2.184  0.663  0.944  0.073  3.866  7.329 × 10^{4}
255. GeV 2.556 × 10^{5} 2.206  0.871  1.242  0.094  4.413 Muon critical energy
300. GeV 3.001 × 10^{5} 2.221  1.041  1.486  0.110  4.858  9.632 × 10^{4}
400. GeV 4.001 × 10^{5} 2.246  1.431  2.048  0.147  5.873  1.150 × 10^{5}
800. GeV 8.001 × 10^{5} 2.309  3.044  4.354  0.296  10.005  1.666 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.330  3.873  5.535  0.372  12.110  1.848 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.361  5.535  7.890  0.528  16.315  2.131 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.394  8.080  11.485  0.763  22.723  2.442 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.432  12.330  17.460  1.168  33.391  2.803 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.460  16.638  23.500  1.578  44.177  3.062 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.528  34.017  47.784  3.280  87.610  3.693 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.551  42.777  59.993  4.155 109.477  3.897 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.585  60.251  84.352  5.951 153.140  4.204 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.621  86.624 121.050  8.704 219.001  4.530 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.664 130.529 182.110  13.462 328.767  4.900 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.695 174.601 243.319  18.334 438.950  5.163 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.770 351.173 488.341  38.685 880.971  5.793 × 10^{5}
100. TeV 1.000 × 10^{8} 2.795 439.620 610.970  49.200 1102.586  5.996 × 10^{5}