Muons in ytterbium (Yb)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
70 (Yb) 173.054(5)  6.903  684.0 0.25295 2.5141 0.1144 3.6191 6.3071  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.071  4.071  1.417 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.238  3.238  2.529 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.572  2.572  4.630 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.027  2.027  9.066 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.747  1.747  1.441 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.336  1.336  4.138 × 10^{1}
100. MeV 1.764 × 10^{2} 1.264  1.264  5.681 × 10^{1}
140. MeV 2.218 × 10^{2} 1.194  1.195  8.950 × 10^{1}
200. MeV 2.868 × 10^{2} 1.162  1.163  1.406 × 10^{2}
237. MeV 3.260 × 10^{2} 1.159  0.000  1.159 Minimum ionization
300. MeV 3.917 × 10^{2} 1.165  0.000  0.000  1.165  2.267 × 10^{2}
400. MeV 4.945 × 10^{2} 1.184  0.000  0.000  1.185  3.119 × 10^{2}
800. MeV 8.995 × 10^{2} 1.269  0.001  0.000  1.270  6.375 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.303  0.001  0.000  1.304  7.928 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.356  0.002  0.000  0.001  1.359  1.093 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.415  0.004  0.001  0.001  1.420  1.524 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.481  0.006  0.003  0.001  1.492  2.210 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.527  0.009  0.006  0.002  1.544  2.868 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.633  0.022  0.020  0.003  1.679  5.342 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.664  0.029  0.029  0.004  1.727  6.516 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.710  0.045  0.047  0.005  1.808  8.778 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.756  0.070  0.077  0.007  1.911  1.200 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.804  0.115  0.135  0.011  2.066  1.703 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.837  0.162  0.198  0.014  2.212  2.171 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.908  0.366  0.477  0.028  2.780  3.780 × 10^{4}
100. GeV 1.001 × 10^{5} 1.929  0.474  0.628  0.035  3.067  4.465 × 10^{4}
140. GeV 1.401 × 10^{5} 1.960  0.696  0.938  0.049  3.643  5.660 × 10^{4}
161. GeV 1.607 × 10^{5} 1.972  0.813  1.103  0.056  3.945 Muon critical energy
200. GeV 2.001 × 10^{5} 1.991  1.043  1.429  0.069  4.533  7.135 × 10^{4}
300. GeV 3.001 × 10^{5} 2.025  1.635  2.249  0.104  6.014  9.045 × 10^{4}
400. GeV 4.001 × 10^{5} 2.049  2.246  3.099  0.139  7.534  1.053 × 10^{5}
800. GeV 8.001 × 10^{5} 2.107  4.771  6.581  0.280  13.741  1.440 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.126  6.067  8.362  0.352  16.909  1.571 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.155  8.665  11.915  0.499  23.235  1.772 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.186  12.637  17.335  0.721  32.880  1.988 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.221  19.265  26.342  1.102  48.931  2.236 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.247  25.979  35.443  1.489  65.160  2.413 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.309  53.042  72.024  3.093 130.469  2.838 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.330  66.675  90.410  3.916 163.333  2.975 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.361  93.868 127.097  5.605 228.933  3.181 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.395 134.888 182.360  8.192 327.837  3.399 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.435 203.176 274.303  12.660 492.576  3.646 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.463 271.700 366.460  17.231 657.856  3.821 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.533 546.175 735.347  36.310 1320.367  4.242 × 10^{5}
100. TeV 1.000 × 10^{8} 2.555 683.630 919.960  46.160 1652.307  4.377 × 10^{5}