Muons in xenon gas (Xe)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
54 (Xe) 131.293(6) 5.483 × 10^{−3} 482.0 0.23314 2.7414 1.5631 4.7372 12.7285 0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.447  4.447  1.281 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.518  3.519  2.302 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.783  2.784  4.240 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.187  2.187  8.346 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.883  1.883  1.330 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.440  1.440  3.834 × 10^{1}
100. MeV 1.764 × 10^{2} 1.362  1.362  5.265 × 10^{1}
140. MeV 2.218 × 10^{2} 1.289  1.289  8.298 × 10^{1}
200. MeV 2.868 × 10^{2} 1.257  1.257  1.303 × 10^{2}
226. MeV 3.145 × 10^{2} 1.255  1.255 Minimum ionization
300. MeV 3.917 × 10^{2} 1.265  0.000  0.000  1.265  2.097 × 10^{2}
400. MeV 4.945 × 10^{2} 1.291  0.000  0.000  1.291  2.880 × 10^{2}
800. MeV 8.995 × 10^{2} 1.400  0.001  0.000  1.401  5.848 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.444  0.001  0.000  1.446  7.253 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.515  0.002  0.000  0.001  1.518  9.950 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.595  0.003  0.001  0.001  1.600  1.379 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.689  0.005  0.003  0.001  1.698  1.985 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.756  0.007  0.005  0.002  1.771  2.561 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.913  0.018  0.017  0.003  1.952  4.701 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.960  0.024  0.024  0.004  2.012  5.709 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.028  0.036  0.039  0.005  2.109  7.649 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.095  0.056  0.064  0.008  2.224  1.042 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.166  0.092  0.112  0.011  2.382  1.476 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.214  0.130  0.164  0.015  2.522  1.883 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.316  0.293  0.393  0.029  3.032  3.326 × 10^{4}
100. GeV 1.001 × 10^{5} 2.347  0.380  0.516  0.036  3.279  3.960 × 10^{4}
140. GeV 1.401 × 10^{5} 2.390  0.557  0.770  0.050  3.769  5.097 × 10^{4}
200. GeV 2.001 × 10^{5} 2.434  0.836  1.173  0.071  4.514  6.550 × 10^{4}
232. GeV 2.320 × 10^{5} 2.451  0.985  1.384  0.082  4.903 Muon critical energy
300. GeV 3.001 × 10^{5} 2.480  1.310  1.846  0.106  5.744  8.510 × 10^{4}
400. GeV 4.001 × 10^{5} 2.511  1.801  2.543  0.142  6.999  1.008 × 10^{5}
800. GeV 8.001 × 10^{5} 2.583  3.829  5.401  0.287  12.100  1.438 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.605  4.870  6.863  0.361  14.699  1.588 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.637  6.958  9.779  0.511  19.885  1.821 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.670  10.151  14.229  0.739  27.790  2.075 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.708  15.481  21.625  1.130  40.945  2.370 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.734  20.883  29.099  1.526  54.244  2.581 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.798  42.663  59.144  3.171 107.778  3.094 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.819  53.639  74.247  4.016 134.722  3.260 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.851  75.530 104.381  5.749 188.513  3.510 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.885 108.560 149.776  8.404 269.627  3.775 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.925 163.548 225.304  12.992 404.770  4.075 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.954 218.733 301.010  17.689 540.387  4.288 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.025 439.800 604.039  37.295 1084.161  4.801 × 10^{5}
100. TeV 1.000 × 10^{8} 3.048 550.520 755.690  47.420 1356.679  4.965 × 10^{5}