Muons in viton fluoroelastomer [(C_5H_2F8)_n]

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.48585 1.800 98.6 0.09965 3.4556 0.2106 2.7874 3.5943 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 6.725 6.725 8.240 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.253 5.253 1.504 × 10^0 20.0 MeV 6.802 × 10^1 4.108 4.108 2.811 × 10^0 30.0 MeV 8.509 × 10^1 3.191 3.191 5.611 × 10^0 40.0 MeV 1.003 × 10^2 2.727 2.727 9.023 × 10^0 80.0 MeV 1.527 × 10^2 2.052 2.052 2.647 × 10^1 100. MeV 1.764 × 10^2 1.930 1.930 3.654 × 10^1 140. MeV 2.218 × 10^2 1.800 1.800 5.810 × 10^1 200. MeV 2.868 × 10^2 1.727 1.727 9.226 × 10^1 300. MeV 3.917 × 10^2 1.701 0.000 1.701 1.508 × 10^2 308. MeV 4.000 × 10^2 1.701 0.000 1.701 Minimum ionization 400. MeV 4.945 × 10^2 1.708 0.000 1.709 2.095 × 10^2 800. MeV 8.995 × 10^2 1.778 0.000 0.000 1.778 4.390 × 10^2 1.00 GeV 1.101 × 10^3 1.809 0.000 0.000 1.809 5.504 × 10^2 1.40 GeV 1.502 × 10^3 1.859 0.000 0.000 0.001 1.860 7.683 × 10^2 2.00 GeV 2.103 × 10^3 1.914 0.001 0.000 0.001 1.915 1.086 × 10^3 3.00 GeV 3.104 × 10^3 1.976 0.001 0.001 0.001 1.979 1.599 × 10^3 4.00 GeV 4.104 × 10^3 2.019 0.002 0.001 0.002 2.024 2.098 × 10^3 8.00 GeV 8.105 × 10^3 2.118 0.004 0.004 0.004 2.129 4.019 × 10^3 10.0 GeV 1.011 × 10^4 2.148 0.005 0.005 0.005 2.162 4.951 × 10^3 14.0 GeV 1.411 × 10^4 2.191 0.008 0.008 0.006 2.213 6.779 × 10^3 20.0 GeV 2.011 × 10^4 2.234 0.012 0.014 0.009 2.269 9.454 × 10^3 30.0 GeV 3.011 × 10^4 2.281 0.019 0.024 0.013 2.338 1.379 × 10^4 40.0 GeV 4.011 × 10^4 2.313 0.027 0.035 0.017 2.393 1.802 × 10^4 80.0 GeV 8.011 × 10^4 2.387 0.062 0.084 0.034 2.567 3.413 × 10^4 100. GeV 1.001 × 10^5 2.410 0.081 0.111 0.042 2.643 4.181 × 10^4 140. GeV 1.401 × 10^5 2.444 0.119 0.166 0.058 2.787 5.654 × 10^4 200. GeV 2.001 × 10^5 2.479 0.179 0.254 0.082 2.995 7.730 × 10^4 300. GeV 3.001 × 10^5 2.520 0.282 0.403 0.123 3.329 1.090 × 10^5 400. GeV 4.001 × 10^5 2.548 0.390 0.559 0.164 3.661 1.376 × 10^5 800. GeV 8.001 × 10^5 2.618 0.835 1.204 0.332 4.989 2.308 × 10^5 879. GeV 8.795 × 10^5 2.627 0.925 1.336 0.366 5.255 Muon critical energy 1.00 TeV 1.000 × 10^6 2.640 1.065 1.538 0.417 5.661 2.684 × 10^5 1.40 TeV 1.400 × 10^6 2.675 1.527 2.201 0.592 6.995 3.319 × 10^5 2.00 TeV 2.000 × 10^6 2.712 2.238 3.217 0.857 9.024 4.072 × 10^5 3.00 TeV 3.000 × 10^6 2.754 3.428 4.908 1.313 12.403 5.014 × 10^5 4.00 TeV 4.000 × 10^6 2.785 4.638 6.621 1.776 15.821 5.726 × 10^5 8.00 TeV 8.000 × 10^6 2.860 9.535 13.522 3.705 29.622 7.545 × 10^5 10.0 TeV 1.000 × 10^7 2.885 12.010 16.996 4.698 36.589 8.151 × 10^5 14.0 TeV 1.400 × 10^7 2.923 16.947 23.920 6.744 50.534 9.078 × 10^5 20.0 TeV 2.000 × 10^7 2.964 24.412 34.362 9.885 71.623 1.007 × 10^6 30.0 TeV 3.000 × 10^7 3.011 36.841 51.738 15.336 106.925 1.121 × 10^6 40.0 TeV 4.000 × 10^7 3.045 49.332 69.168 20.928 142.473 1.201 × 10^6 80.0 TeV 8.000 × 10^7 3.128 99.412 138.949 44.382 285.871 1.396 × 10^6 100. TeV 1.000 × 10^8 3.156 124.515 173.880 56.533 358.084 1.458 × 10^6