Muons in vanadium (V)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
23 (V) 50.9415(1)  6.110  245.0 0.15436 3.0163 0.0691 3.0322 4.2659  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.463  5.463  1.028 × 10^{0}
14.0 MeV 5.616 × 10^{1} 4.292  4.292  1.862 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.372  3.373  3.457 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.631  2.631  6.859 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.253  2.254  1.099 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.700  1.700  3.207 × 10^{1}
100. MeV 1.764 × 10^{2} 1.600  1.600  4.422 × 10^{1}
140. MeV 2.218 × 10^{2} 1.501  1.501  7.015 × 10^{1}
200. MeV 2.868 × 10^{2} 1.449  1.449  1.110 × 10^{2}
273. MeV 3.633 × 10^{2} 1.436  0.000  1.437 Minimum ionization
300. MeV 3.917 × 10^{2} 1.437  0.000  1.438  1.805 × 10^{2}
400. MeV 4.945 × 10^{2} 1.451  0.000  0.000  1.452  2.497 × 10^{2}
800. MeV 8.995 × 10^{2} 1.529  0.000  0.000  1.530  5.180 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.561  0.001  0.000  1.562  6.473 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.613  0.001  0.000  0.001  1.615  8.990 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.669  0.001  0.001  0.001  1.673  1.264 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.733  0.003  0.002  0.001  1.739  1.849 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.777  0.004  0.003  0.002  1.786  2.416 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.877  0.009  0.009  0.003  1.899  4.581 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.907  0.012  0.013  0.004  1.936  5.624 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.950  0.018  0.020  0.006  1.995  7.658 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.993  0.028  0.033  0.008  2.063  1.061 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.039  0.046  0.058  0.012  2.155  1.535 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.069  0.065  0.084  0.016  2.236  1.991 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.138  0.148  0.202  0.031  2.520  3.673 × 10^{4}
100. GeV 1.001 × 10^{5} 2.160  0.192  0.266  0.039  2.656  4.446 × 10^{4}
140. GeV 1.401 × 10^{5} 2.191  0.282  0.397  0.054  2.925  5.880 × 10^{4}
200. GeV 2.001 × 10^{5} 2.224  0.423  0.606  0.077  3.330  7.802 × 10^{4}
300. GeV 3.001 × 10^{5} 2.262  0.664  0.956  0.115  3.997  1.054 × 10^{5}
385. GeV 3.848 × 10^{5} 2.285  0.875  1.263  0.147  4.570 Muon critical energy
400. GeV 4.001 × 10^{5} 2.288  0.913  1.319  0.153  4.674  1.285 × 10^{5}
800. GeV 8.001 × 10^{5} 2.353  1.947  2.812  0.309  7.421  1.959 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.374  2.478  3.577  0.388  8.818  2.205 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.406  3.546  5.104  0.550  11.607  2.600 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.440  5.181  7.437  0.797  15.856  3.040 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.480  7.914  11.316  1.219  22.930  3.562 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.508  10.687  15.239  1.648  30.084  3.942 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.578  21.882  31.019  3.431  58.910  4.875 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.601  27.529  38.955  4.347  73.433  5.178 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.637  38.795  54.786  6.230 102.448  5.637 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.674  55.806  78.644  9.118 146.243  6.125 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.718  84.125 118.339  14.115 219.298  6.680 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.750 112.559 158.138  19.235 292.682  7.073 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.828 226.515 317.459  40.647 587.449  8.019 × 10^{5}
100. TeV 1.000 × 10^{8} 2.853 283.610 397.200  51.720 735.384  8.322 × 10^{5}