Muons in uranium (U)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
92 (U) [238.02891(3)] 18.950  890.0 0.19677 2.8171 0.2260 3.3721 5.8694  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.665  3.665  1.595 × 10^{0}
14.0 MeV 5.616 × 10^{1} 2.933  2.933  2.826 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.342  2.342  5.138 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.855  1.855  9.995 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.604  1.604  1.583 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.234  1.234  4.509 × 10^{1}
100. MeV 1.764 × 10^{2} 1.169  1.169  6.178 × 10^{1}
140. MeV 2.218 × 10^{2} 1.109  1.109  9.707 × 10^{1}
200. MeV 2.868 × 10^{2} 1.083  1.083  1.520 × 10^{2}
227. MeV 3.154 × 10^{2} 1.081  0.000  1.082 Minimum ionization
300. MeV 3.917 × 10^{2} 1.089  0.000  0.000  1.089  2.443 × 10^{2}
400. MeV 4.945 × 10^{2} 1.109  0.000  0.000  1.109  3.353 × 10^{2}
800. MeV 8.995 × 10^{2} 1.191  0.001  0.000  1.192  6.824 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.223  0.002  0.000  1.225  8.478 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.273  0.003  0.001  1.277  1.167 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.328  0.004  0.001  0.001  1.334  1.627 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.389  0.007  0.003  0.001  1.402  2.357 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.431  0.011  0.006  0.002  1.451  3.057 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.527  0.027  0.023  0.003  1.580  5.688 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.555  0.036  0.032  0.004  1.628  6.935 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.596  0.055  0.053  0.005  1.711  9.330 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.637  0.086  0.088  0.007  1.819  1.273 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.680  0.140  0.156  0.011  1.988  1.798 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.708  0.198  0.230  0.014  2.152  2.282 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.771  0.449  0.560  0.027  2.808  3.904 × 10^{4}
100. GeV 1.001 × 10^{5} 1.790  0.581  0.738  0.034  3.145  4.577 × 10^{4}
128. GeV 1.284 × 10^{5} 1.810  0.772  0.995  0.043  3.623 Muon critical energy
140. GeV 1.401 × 10^{5} 1.818  0.853  1.105  0.047  3.824  5.729 × 10^{4}
200. GeV 2.001 × 10^{5} 1.846  1.278  1.686  0.067  4.879  7.116 × 10^{4}
300. GeV 3.001 × 10^{5} 1.878  2.004  2.655  0.101  6.640  8.867 × 10^{4}
400. GeV 4.001 × 10^{5} 1.901  2.753  3.660  0.135  8.451  1.020 × 10^{5}
800. GeV 8.001 × 10^{5} 1.956  5.844  7.781  0.272  15.855  1.360 × 10^{5}
1.00 TeV 1.000 × 10^{6} 1.974  7.430  9.888  0.342  19.637  1.473 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.002  10.607  14.090  0.484  27.185  1.646 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.031  15.463  20.503  0.700  38.699  1.830 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.065  23.564  31.156  1.070  57.858  2.040 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.089  31.769  41.921  1.446  77.228  2.189 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.149  64.824  85.189  3.001 155.165  2.547 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.169  81.471 106.935  3.799 194.376  2.662 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.199 114.675 150.327  5.436 272.640  2.835 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.232 164.754 215.690  7.944 390.622  3.018 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.269 248.123 324.427  12.273 587.094  3.225 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.296 331.768 433.413  16.702 784.182  3.372 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.363 666.782 869.666  35.176 1573.988  3.725 × 10^{5}
100. TeV 1.000 × 10^{8} 2.385 834.540 1087.990  44.710 1969.627  3.838 × 10^{5}