Muons in tungsten (W)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
74 (W) 183.84(1)  19.300  727.0 0.15509 2.8447 0.2167 3.4960 5.4059  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.000  4.000  1.446 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.185  3.186  2.577 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.534  2.534  4.711 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.000  2.000  9.210 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.726  1.726  1.463 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.323  1.323  4.189 × 10^{1}
100. MeV 1.764 × 10^{2} 1.251  1.251  5.747 × 10^{1}
140. MeV 2.218 × 10^{2} 1.182  1.182  9.051 × 10^{1}
200. MeV 2.868 × 10^{2} 1.149  1.149  1.422 × 10^{2}
242. MeV 3.316 × 10^{2} 1.145  0.000  1.145 Minimum ionization
300. MeV 3.917 × 10^{2} 1.150  0.000  0.000  1.150  2.294 × 10^{2}
400. MeV 4.945 × 10^{2} 1.168  0.000  0.000  1.168  3.157 × 10^{2}
800. MeV 8.995 × 10^{2} 1.247  0.001  0.000  1.249  6.464 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.279  0.001  0.000  1.281  8.045 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.329  0.002  0.001  1.332  1.110 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.384  0.004  0.001  0.001  1.390  1.551 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.446  0.006  0.003  0.001  1.458  2.252 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.489  0.009  0.006  0.002  1.507  2.926 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.587  0.023  0.021  0.003  1.634  5.465 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.616  0.031  0.030  0.004  1.681  6.671 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.658  0.047  0.048  0.005  1.760  8.996 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.700  0.073  0.080  0.007  1.861  1.231 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.745  0.120  0.140  0.011  2.016  1.747 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.774  0.169  0.206  0.014  2.164  2.225 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.840  0.383  0.496  0.028  2.748  3.861 × 10^{4}
100. GeV 1.001 × 10^{5} 1.860  0.496  0.653  0.035  3.045  4.553 × 10^{4}
140. GeV 1.401 × 10^{5} 1.889  0.728  0.975  0.048  3.642  5.753 × 10^{4}
150. GeV 1.499 × 10^{5} 1.895  0.786  1.057  0.052  3.791 Muon critical energy
200. GeV 2.001 × 10^{5} 1.919  1.092  1.486  0.069  4.567  7.222 × 10^{4}
300. GeV 3.001 × 10^{5} 1.952  1.711  2.339  0.103  6.108  9.110 × 10^{4}
400. GeV 4.001 × 10^{5} 1.976  2.352  3.223  0.138  7.690  1.057 × 10^{5}
800. GeV 8.001 × 10^{5} 2.034  4.994  6.846  0.279  14.154  1.434 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.052  6.350  8.699  0.350  17.454  1.562 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.081  9.068  12.394  0.496  24.041  1.756 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.112  13.224  18.033  0.717  34.087  1.965 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.147  20.158  27.402  1.096  50.805  2.203 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.172  27.183  36.869  1.481  67.707  2.373 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.235  55.492  74.921  3.076 135.725  2.782 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.255  69.752  94.046  3.894 169.949  2.914 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.287  98.195 132.208  5.573 238.264  3.112 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.320 141.100 189.692  8.144 341.258  3.321 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.359 212.526 285.333  12.585 512.806  3.559 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.388 284.197 381.197  17.129 684.912  3.727 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.457 571.275 764.894  36.091 1374.719  4.131 × 10^{5}
100. TeV 1.000 × 10^{8} 2.480 715.040 956.910  45.880 1720.312  4.260 × 10^{5}