Muons in titanium (Ti)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
22 (Ti) 47.867(1)  4.540  233.0 0.15662 3.0302 0.0957 3.0386 4.4450  0.12
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.608  5.608  1.000 × 10^{0}
14.0 MeV 5.616 × 10^{1} 4.404  4.404  1.813 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.460  3.460  3.368 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.699  2.699  6.684 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.312  2.312  1.071 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.746  1.746  3.124 × 10^{1}
100. MeV 1.764 × 10^{2} 1.644  1.644  4.308 × 10^{1}
140. MeV 2.218 × 10^{2} 1.543  1.543  6.832 × 10^{1}
200. MeV 2.868 × 10^{2} 1.489  1.490  1.080 × 10^{2}
274. MeV 3.642 × 10^{2} 1.477  0.000  1.477 Minimum ionization
300. MeV 3.917 × 10^{2} 1.478  0.000  1.478  1.756 × 10^{2}
400. MeV 4.945 × 10^{2} 1.493  0.000  0.000  1.493  2.430 × 10^{2}
800. MeV 8.995 × 10^{2} 1.573  0.000  0.000  1.573  5.038 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.606  0.001  0.000  1.607  6.295 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.659  0.001  0.000  0.001  1.661  8.741 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.717  0.001  0.001  0.001  1.720  1.229 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.783  0.002  0.002  0.001  1.788  1.798 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.828  0.004  0.003  0.002  1.836  2.350 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.930  0.009  0.009  0.004  1.951  4.455 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.960  0.012  0.012  0.004  1.989  5.470 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.004  0.018  0.020  0.006  2.048  7.450 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.048  0.028  0.032  0.008  2.117  1.033 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.095  0.045  0.056  0.012  2.209  1.495 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.126  0.064  0.082  0.016  2.289  1.939 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.196  0.145  0.198  0.031  2.571  3.586 × 10^{4}
100. GeV 1.001 × 10^{5} 2.218  0.188  0.260  0.039  2.705  4.344 × 10^{4}
140. GeV 1.401 × 10^{5} 2.250  0.276  0.388  0.054  2.969  5.755 × 10^{4}
200. GeV 2.001 × 10^{5} 2.284  0.413  0.592  0.077  3.367  7.652 × 10^{4}
300. GeV 3.001 × 10^{5} 2.322  0.649  0.935  0.115  4.022  1.037 × 10^{5}
400. GeV 4.001 × 10^{5} 2.349  0.893  1.290  0.154  4.686  1.267 × 10^{5}
402. GeV 4.021 × 10^{5} 2.350  0.898  1.297  0.154  4.700 Muon critical energy
800. GeV 8.001 × 10^{5} 2.415  1.904  2.750  0.311  7.380  1.941 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.436  2.425  3.498  0.390  8.750  2.190 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.469  3.469  4.992  0.553  11.484  2.588 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.504  5.069  7.275  0.800  15.649  3.034 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.544  7.744  11.070  1.225  22.584  3.563 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.573  10.458  14.909  1.656  29.597  3.949 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.644  21.415  30.350  3.446  57.857  4.898 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.668  26.943  38.117  4.367  72.096  5.207 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.704  37.980  53.610  6.259 100.553  5.675 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.742  54.650  76.958  9.162 143.513  6.172 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.787  82.367 115.805  14.185 215.144  6.737 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.819 110.193 154.754  19.332 287.098  7.138 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.898 221.736 310.672  40.858 576.164  8.102 × 10^{5}
100. TeV 1.000 × 10^{8} 2.924 277.630 388.710  51.990 721.255  8.412 × 10^{5}