Muons in tin (Sn)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
50 (Sn) 118.710(7)  7.310  488.0 0.18689 2.8576 0.2879 3.2959 5.5340  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.538  4.538  1.256 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.591  3.591  2.257 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.840  2.840  4.156 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.231  2.231  8.181 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.920  1.920  1.304 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.464  1.464  3.762 × 10^{1}
100. MeV 1.764 × 10^{2} 1.383  1.383  5.171 × 10^{1}
140. MeV 2.218 × 10^{2} 1.305  1.305  8.161 × 10^{1}
200. MeV 2.868 × 10^{2} 1.268  1.268  1.284 × 10^{2}
246. MeV 3.356 × 10^{2} 1.263  1.264 Minimum ionization
300. MeV 3.917 × 10^{2} 1.268  0.000  0.000  1.268  2.074 × 10^{2}
400. MeV 4.945 × 10^{2} 1.286  0.000  0.000  1.287  2.858 × 10^{2}
800. MeV 8.995 × 10^{2} 1.371  0.001  0.000  1.372  5.864 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.404  0.001  0.000  1.406  7.304 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.458  0.002  0.000  0.001  1.460  1.009 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.515  0.003  0.001  0.001  1.520  1.412 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.580  0.005  0.003  0.001  1.590  2.054 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.625  0.007  0.005  0.002  1.639  2.673 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.727  0.017  0.017  0.003  1.764  5.016 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.757  0.023  0.023  0.004  1.807  6.136 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.800  0.035  0.038  0.005  1.879  8.305 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.844  0.054  0.062  0.008  1.967  1.142 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.889  0.088  0.107  0.011  2.096  1.634 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.919  0.124  0.157  0.015  2.216  2.098 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.987  0.280  0.377  0.029  2.674  3.738 × 10^{4}
100. GeV 1.001 × 10^{5} 2.007  0.363  0.495  0.036  2.902  4.456 × 10^{4}
140. GeV 1.401 × 10^{5} 2.037  0.533  0.739  0.050  3.360  5.736 × 10^{4}
200. GeV 2.001 × 10^{5} 2.068  0.798  1.125  0.072  4.064  7.358 × 10^{4}
207. GeV 2.069 × 10^{5} 2.071  0.829  1.168  0.074  4.143 Muon critical energy
300. GeV 3.001 × 10^{5} 2.103  1.252  1.771  0.107  5.234  9.522 × 10^{4}
400. GeV 4.001 × 10^{5} 2.128  1.721  2.440  0.143  6.433  1.124 × 10^{5}
800. GeV 8.001 × 10^{5} 2.188  3.659  5.182  0.290  11.320  1.587 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.208  4.655  6.585  0.364  13.813  1.747 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.237  6.651  9.385  0.515  18.789  1.994 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.269  9.704  13.657  0.745  26.377  2.263 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.306  14.802  20.756  1.139  39.005  2.573 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.333  19.969  27.932  1.540  51.774  2.794 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.398  40.801  56.776  3.200 103.176  3.331 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.420  51.300  71.275  4.052 129.048  3.504 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.452  72.241 100.206  5.801 180.702  3.765 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.488 103.840 143.788  8.482 258.599  4.041 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.529 156.444 216.299  13.115 388.388  4.354 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.558 209.238 288.983  17.857 518.637  4.576 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.631 420.738 579.930  37.655 1040.955  5.110 × 10^{5}
100. TeV 1.000 × 10^{8} 2.655 526.670 725.540  47.880 1302.746  5.281 × 10^{5}