Muons in thulium (Tm)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
69 (Tm) 168.93422(2) 9.321  674.0 0.24889 2.5469 0.0812 3.5085 5.9677  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.123  4.123  1.398 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.277  3.277  2.497 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.602  2.603  4.572 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.050  2.050  8.957 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.767  1.767  1.424 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.351  1.351  4.092 × 10^{1}
100. MeV 1.764 × 10^{2} 1.277  1.277  5.619 × 10^{1}
140. MeV 2.218 × 10^{2} 1.206  1.207  8.855 × 10^{1}
200. MeV 2.868 × 10^{2} 1.174  1.174  1.391 × 10^{2}
237. MeV 3.260 × 10^{2} 1.170  0.000  1.170 Minimum ionization
300. MeV 3.917 × 10^{2} 1.175  0.000  0.000  1.175  2.245 × 10^{2}
400. MeV 4.945 × 10^{2} 1.194  0.000  0.000  1.195  3.089 × 10^{2}
800. MeV 8.995 × 10^{2} 1.278  0.001  0.000  1.280  6.319 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.312  0.001  0.000  1.314  7.862 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.365  0.002  0.000  0.001  1.368  1.084 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.423  0.004  0.001  0.001  1.429  1.513 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.489  0.006  0.003  0.001  1.500  2.195 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.535  0.009  0.006  0.002  1.552  2.850 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.639  0.022  0.020  0.003  1.685  5.313 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.670  0.029  0.029  0.004  1.733  6.483 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.715  0.045  0.047  0.005  1.813  8.738 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.760  0.070  0.077  0.007  1.915  1.196 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.808  0.114  0.135  0.011  2.069  1.698 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.840  0.161  0.198  0.014  2.214  2.165 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.909  0.365  0.477  0.028  2.780  3.773 × 10^{4}
100. GeV 1.001 × 10^{5} 1.930  0.472  0.627  0.035  3.066  4.458 × 10^{4}
140. GeV 1.401 × 10^{5} 1.961  0.693  0.936  0.049  3.640  5.654 × 10^{4}
161. GeV 1.611 × 10^{5} 1.973  0.813  1.104  0.056  3.947 Muon critical energy
200. GeV 2.001 × 10^{5} 1.992  1.039  1.426  0.069  4.528  7.130 × 10^{4}
300. GeV 3.001 × 10^{5} 2.026  1.629  2.245  0.104  6.006  9.043 × 10^{4}
400. GeV 4.001 × 10^{5} 2.050  2.239  3.092  0.139  7.522  1.053 × 10^{5}
800. GeV 8.001 × 10^{5} 2.108  4.756  6.568  0.281  13.715  1.441 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.127  6.048  8.346  0.353  16.876  1.572 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.156  8.638  11.891  0.500  23.187  1.774 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.187  12.597  17.301  0.723  32.810  1.990 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.223  19.205  26.290  1.105  48.825  2.239 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.249  25.900  35.373  1.493  65.016  2.416 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.312  52.880  71.882  3.099 130.175  2.842 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.333  66.472  90.232  3.924 162.963  2.979 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.365  93.583 126.847  5.617 228.413  3.185 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.399 134.480 182.002  8.210 327.093  3.404 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.439 202.563 273.766  12.688 491.458  3.651 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.467 270.881 365.744  17.270 656.365  3.827 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.538 544.541 733.910  36.395 1317.385  4.248 × 10^{5}
100. TeV 1.000 × 10^{8} 2.561 681.590 918.160  46.270 1648.583  4.384 × 10^{5}