Muons in thorium (Th)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
90 (Th) [232.0377(4)] 11.720  847.0 0.08655 3.2610 0.4202 3.7681 6.2473  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.727  3.727  1.563 × 10^{0}
14.0 MeV 5.616 × 10^{1} 2.979  2.979  2.774 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.376  2.376  5.052 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.881  1.881  9.842 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.626  1.626  1.559 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.253  1.253  4.444 × 10^{1}
100. MeV 1.764 × 10^{2} 1.187  1.188  6.087 × 10^{1}
140. MeV 2.218 × 10^{2} 1.126  1.126  9.561 × 10^{1}
200. MeV 2.868 × 10^{2} 1.099  1.099  1.497 × 10^{2}
223. MeV 3.114 × 10^{2} 1.098  0.000  1.098 Minimum ionization
300. MeV 3.917 × 10^{2} 1.107  0.000  0.000  1.107  2.405 × 10^{2}
400. MeV 4.945 × 10^{2} 1.129  0.000  0.000  1.129  3.300 × 10^{2}
800. MeV 8.995 × 10^{2} 1.214  0.001  0.000  1.216  6.707 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.247  0.002  0.000  1.249  8.330 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.299  0.003  0.001  1.302  1.146 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.354  0.004  0.001  0.001  1.360  1.597 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.417  0.007  0.003  0.001  1.429  2.313 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.459  0.011  0.006  0.002  1.478  3.000 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.556  0.027  0.023  0.003  1.609  5.583 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.585  0.035  0.032  0.004  1.657  6.808 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.626  0.054  0.053  0.005  1.739  9.163 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.667  0.084  0.087  0.007  1.847  1.251 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.711  0.138  0.154  0.011  2.015  1.769 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.740  0.195  0.228  0.014  2.178  2.246 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.804  0.441  0.553  0.027  2.827  3.854 × 10^{4}
100. GeV 1.001 × 10^{5} 1.823  0.572  0.729  0.034  3.159  4.523 × 10^{4}
132. GeV 1.321 × 10^{5} 1.847  0.785  1.017  0.045  3.695 Muon critical energy
140. GeV 1.401 × 10^{5} 1.851  0.839  1.091  0.047  3.830  5.672 × 10^{4}
200. GeV 2.001 × 10^{5} 1.881  1.257  1.664  0.067  4.871  7.058 × 10^{4}
300. GeV 3.001 × 10^{5} 1.913  1.971  2.621  0.101  6.608  8.815 × 10^{4}
400. GeV 4.001 × 10^{5} 1.936  2.708  3.613  0.135  8.394  1.016 × 10^{5}
800. GeV 8.001 × 10^{5} 1.992  5.748  7.680  0.273  15.695  1.359 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.010  7.309  9.760  0.343  19.423  1.473 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.037  10.434  13.907  0.485  26.866  1.648 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.067  15.212  20.235  0.702  38.218  1.834 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.101  23.182  30.750  1.073  57.107  2.047 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.125  31.254  41.375  1.449  76.205  2.198 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.185  63.776  84.077  3.009 153.049  2.561 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.205  80.155 105.539  3.809 191.710  2.677 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.235 112.825 148.365  5.450 268.877  2.853 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.268 162.098 212.874  7.964 385.206  3.038 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.305 244.125 320.192  12.304 578.930  3.248 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.333 326.426 427.757  16.745 773.263  3.397 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.399 656.056 858.311  35.269 1552.038  3.755 × 10^{5}
100. TeV 1.000 × 10^{8} 2.421 821.120 1073.780  44.830 1942.153  3.870 × 10^{5}