Muons in thallium (Tl)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
81 (Tl) 204.38(2)  11.720  810.0 0.09455 3.1450 0.3491 3.8044 6.1365  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.843  3.843  1.514 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.069  3.069  2.690 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.447  2.447  4.902 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.935  1.935  9.555 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.672  1.673  1.515 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.287  1.287  4.322 × 10^{1}
100. MeV 1.764 × 10^{2} 1.219  1.219  5.922 × 10^{1}
140. MeV 2.218 × 10^{2} 1.154  1.155  9.308 × 10^{1}
200. MeV 2.868 × 10^{2} 1.127  1.127  1.459 × 10^{2}
227. MeV 3.154 × 10^{2} 1.125  0.000  1.125 Minimum ionization
300. MeV 3.917 × 10^{2} 1.132  0.000  0.000  1.133  2.346 × 10^{2}
400. MeV 4.945 × 10^{2} 1.153  0.000  0.000  1.154  3.221 × 10^{2}
800. MeV 8.995 × 10^{2} 1.238  0.001  0.000  1.239  6.560 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.271  0.001  0.000  1.273  8.151 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.323  0.002  0.001  1.326  1.123 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.379  0.004  0.001  0.001  1.385  1.565 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.443  0.007  0.003  0.001  1.454  2.268 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.486  0.010  0.006  0.002  1.505  2.943 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.585  0.025  0.022  0.003  1.636  5.483 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.615  0.033  0.031  0.004  1.683  6.688 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.658  0.050  0.051  0.005  1.764  9.007 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.700  0.078  0.083  0.007  1.870  1.231 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.745  0.128  0.147  0.011  2.031  1.744 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.775  0.181  0.216  0.014  2.187  2.218 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.841  0.410  0.523  0.028  2.803  3.829 × 10^{4}
100. GeV 1.001 × 10^{5} 1.861  0.531  0.689  0.034  3.116  4.506 × 10^{4}
140. GeV 1.401 × 10^{5} 1.890  0.779  1.030  0.048  3.748  5.675 × 10^{4}
142. GeV 1.424 × 10^{5} 1.891  0.793  1.050  0.049  3.784 Muon critical energy
200. GeV 2.001 × 10^{5} 1.920  1.167  1.570  0.068  4.727  7.098 × 10^{4}
300. GeV 3.001 × 10^{5} 1.953  1.830  2.472  0.102  6.359  8.917 × 10^{4}
400. GeV 4.001 × 10^{5} 1.977  2.514  3.407  0.137  8.036  1.031 × 10^{5}
800. GeV 8.001 × 10^{5} 2.034  5.338  7.238  0.276  14.888  1.392 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.052  6.788  9.198  0.347  18.386  1.512 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.080  9.692  13.105  0.491  25.370  1.697 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.110  14.131  19.067  0.710  36.021  1.894 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.145  21.539  28.974  1.086  53.746  2.120 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.170  29.042  38.985  1.467  71.665  2.281 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.232  59.276  79.219  3.045 143.773  2.667 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.252  74.504  99.440  3.855 180.053  2.791 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.283 104.878 139.790  5.517 252.469  2.978 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.316 150.692 200.570  8.062 361.642  3.175 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.354 226.962 301.690  12.457 543.465  3.399 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.382 303.490 403.043  16.953 725.870  3.558 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.450 610.012 808.733  35.715 1456.912  3.939 × 10^{5}
100. TeV 1.000 × 10^{8} 2.473 763.510 1011.760  45.400 1823.145  4.062 × 10^{5}