Muons in terbium (Tb)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
65 (Tb) 158.92535(2) 8.230  614.0 0.24453 2.6056 0.0947 3.4224 5.9044  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.211  4.212  1.363 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.342  3.342  2.440 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.650  2.650  4.477 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.085  2.085  8.786 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.796  1.796  1.399 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.371  1.371  4.026 × 10^{1}
100. MeV 1.764 × 10^{2} 1.297  1.297  5.529 × 10^{1}
140. MeV 2.218 × 10^{2} 1.225  1.225  8.715 × 10^{1}
200. MeV 2.868 × 10^{2} 1.192  1.192  1.370 × 10^{2}
239. MeV 3.285 × 10^{2} 1.188  0.000  1.188 Minimum ionization
300. MeV 3.917 × 10^{2} 1.193  0.000  0.000  1.194  2.210 × 10^{2}
400. MeV 4.945 × 10^{2} 1.212  0.000  0.000  1.213  3.041 × 10^{2}
800. MeV 8.995 × 10^{2} 1.297  0.001  0.000  1.298  6.225 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.330  0.001  0.000  1.332  7.746 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.383  0.002  0.000  0.001  1.386  1.069 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.441  0.003  0.001  0.001  1.447  1.492 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.507  0.006  0.003  0.001  1.517  2.166 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.552  0.009  0.006  0.002  1.569  2.813 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.655  0.021  0.020  0.003  1.700  5.253 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.686  0.028  0.028  0.004  1.746  6.413 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.731  0.043  0.045  0.005  1.824  8.653 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.775  0.066  0.074  0.007  1.923  1.185 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.822  0.108  0.129  0.011  2.071  1.686 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.853  0.153  0.189  0.015  2.210  2.153 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.921  0.346  0.455  0.028  2.752  3.771 × 10^{4}
100. GeV 1.001 × 10^{5} 1.942  0.448  0.598  0.035  3.024  4.465 × 10^{4}
140. GeV 1.401 × 10^{5} 1.972  0.657  0.893  0.049  3.573  5.680 × 10^{4}
169. GeV 1.690 × 10^{5} 1.988  0.814  1.116  0.059  3.977 Muon critical energy
200. GeV 2.001 × 10^{5} 2.002  0.985  1.361  0.070  4.419  7.188 × 10^{4}
300. GeV 3.001 × 10^{5} 2.036  1.545  2.141  0.105  5.828  9.154 × 10^{4}
400. GeV 4.001 × 10^{5} 2.061  2.123  2.950  0.140  7.274  1.069 × 10^{5}
800. GeV 8.001 × 10^{5} 2.119  4.510  6.265  0.282  13.178  1.472 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.138  5.735  7.961  0.355  16.191  1.608 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.167  8.191  11.343  0.502  22.206  1.819 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.198  11.947  16.504  0.727  31.378  2.045 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.234  18.216  25.079  1.111  46.641  2.305 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.260  24.567  33.745  1.501  62.074  2.490 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.323  50.166  68.576  3.117 124.184  2.937 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.344  63.063  86.083  3.947 155.439  3.080 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.376  88.788 121.016  5.649 217.831  3.297 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.410 127.596 173.638  8.258 311.904  3.526 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.450 192.201 261.186  12.763 468.601  3.785 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.478 257.032 348.937  17.372 625.821  3.969 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.549 516.724 700.186  36.609 1256.069  4.412 × 10^{5}
100. TeV 1.000 × 10^{8} 2.572 646.780 875.970  46.540 1571.864  4.554 × 10^{5}