Muons in tellurium (Te)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
52 (Te) 127.60(3)  6.240  485.0 0.13815 3.0354 0.3296 3.4418 5.7131  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.398  4.398  1.296 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.479  3.479  2.328 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.752  2.752  4.288 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.162  2.162  8.442 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.860  1.860  1.346 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.419  1.419  3.882 × 10^{1}
100. MeV 1.764 × 10^{2} 1.341  1.341  5.335 × 10^{1}
140. MeV 2.218 × 10^{2} 1.266  1.266  8.419 × 10^{1}
200. MeV 2.868 × 10^{2} 1.231  1.231  1.324 × 10^{2}
243. MeV 3.325 × 10^{2} 1.227  1.227 Minimum ionization
300. MeV 3.917 × 10^{2} 1.232  0.000  0.000  1.232  2.138 × 10^{2}
400. MeV 4.945 × 10^{2} 1.251  0.000  0.000  1.251  2.944 × 10^{2}
800. MeV 8.995 × 10^{2} 1.334  0.001  0.000  1.335  6.035 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.367  0.001  0.000  1.368  7.514 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.419  0.002  0.000  0.001  1.421  1.038 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.475  0.003  0.001  0.001  1.480  1.451 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.538  0.005  0.003  0.001  1.548  2.111 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.582  0.007  0.005  0.002  1.596  2.747 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.681  0.017  0.017  0.003  1.718  5.153 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.710  0.023  0.023  0.004  1.761  6.302 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.752  0.035  0.038  0.005  1.831  8.529 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.794  0.054  0.062  0.008  1.918  1.173 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.839  0.088  0.107  0.011  2.046  1.677 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.868  0.124  0.157  0.015  2.165  2.152 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.934  0.280  0.377  0.029  2.621  3.828 × 10^{4}
100. GeV 1.001 × 10^{5} 1.953  0.363  0.495  0.036  2.849  4.560 × 10^{4}
140. GeV 1.401 × 10^{5} 1.983  0.533  0.739  0.050  3.306  5.862 × 10^{4}
200. GeV 2.001 × 10^{5} 2.013  0.799  1.126  0.071  4.010  7.509 × 10^{4}
202. GeV 2.017 × 10^{5} 2.013  0.806  1.135  0.072  4.028 Muon critical energy
300. GeV 3.001 × 10^{5} 2.047  1.254  1.771  0.107  5.179  9.698 × 10^{4}
400. GeV 4.001 × 10^{5} 2.071  1.724  2.440  0.142  6.378  1.144 × 10^{5}
800. GeV 8.001 × 10^{5} 2.129  3.664  5.183  0.288  11.265  1.610 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.148  4.661  6.587  0.362  13.758  1.770 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.177  6.659  9.386  0.512  18.735  2.018 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.208  9.716  13.658  0.741  26.323  2.287 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.243  14.819  20.757  1.132  38.953  2.598 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.269  19.991  27.932  1.530  51.724  2.820 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.332  40.844  56.774  3.179 103.131  3.357 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.353  51.352  71.272  4.026 129.005  3.530 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.385  72.313 100.200  5.763 180.663  3.791 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.419 103.940 143.778  8.426 258.564  4.067 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.459 156.591 216.283  13.027 388.361  4.380 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.487 209.432 288.960  17.736 518.616  4.602 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.557 421.117 579.876  37.396 1040.948  5.136 × 10^{5}
100. TeV 1.000 × 10^{8} 2.580 527.140 725.470  47.550 1302.742  5.307 × 10^{5}