Muons in technetium (Tc)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
43 (Tc) [97.90722(3)] 11.500  428.0 0.16572 2.9738 0.0949 3.1253 4.7769  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.842  4.842  1.173 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.824  3.824  2.112 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.019  3.019  3.897 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.367  2.367  7.687 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.033  2.033  1.227 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.545  1.545  3.554 × 10^{1}
100. MeV 1.764 × 10^{2} 1.459  1.459  4.889 × 10^{1}
140. MeV 2.218 × 10^{2} 1.374  1.374  7.727 × 10^{1}
200. MeV 2.868 × 10^{2} 1.332  1.333  1.218 × 10^{2}
253. MeV 3.431 × 10^{2} 1.325  1.326 Minimum ionization
300. MeV 3.917 × 10^{2} 1.328  0.000  0.000  1.329  1.971 × 10^{2}
400. MeV 4.945 × 10^{2} 1.346  0.000  0.000  1.346  2.719 × 10^{2}
800. MeV 8.995 × 10^{2} 1.428  0.001  0.000  1.429  5.601 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.461  0.001  0.000  1.462  6.984 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.514  0.001  0.000  0.001  1.516  9.668 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.571  0.002  0.001  0.001  1.575  1.355 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.635  0.004  0.003  0.001  1.644  1.975 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.679  0.006  0.005  0.002  1.692  2.574 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.779  0.015  0.015  0.003  1.814  4.849 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.810  0.020  0.021  0.004  1.856  5.939 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.853  0.031  0.034  0.005  1.924  8.054 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.895  0.048  0.056  0.008  2.008  1.110 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.941  0.079  0.097  0.011  2.129  1.594 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.971  0.111  0.142  0.015  2.241  2.051 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.039  0.252  0.341  0.030  2.662  3.686 × 10^{4}
100. GeV 1.001 × 10^{5} 2.060  0.326  0.448  0.037  2.872  4.409 × 10^{4}
140. GeV 1.401 × 10^{5} 2.091  0.479  0.669  0.051  3.290  5.710 × 10^{4}
200. GeV 2.001 × 10^{5} 2.123  0.718  1.018  0.073  3.933  7.376 × 10^{4}
232. GeV 2.324 × 10^{5} 2.136  0.848  1.204  0.084  4.274 Muon critical energy
300. GeV 3.001 × 10^{5} 2.159  1.126  1.603  0.109  4.998  9.627 × 10^{4}
400. GeV 4.001 × 10^{5} 2.185  1.548  2.209  0.145  6.088  1.144 × 10^{5}
800. GeV 8.001 × 10^{5} 2.248  3.292  4.693  0.294  10.529  1.638 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.269  4.189  5.965  0.369  12.792  1.810 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.300  5.986  8.502  0.523  17.312  2.077 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.333  8.736  12.375  0.757  24.202  2.369 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.372  13.329  18.811  1.157  35.669  2.708 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.399  17.984  25.316  1.564  47.264  2.951 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.467  36.760  51.468  3.251  93.948  3.539 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.490  46.224  64.616  4.117 117.448  3.729 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.524  65.101  90.848  5.896 164.370  4.016 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.561  93.588 130.368  8.622 235.140  4.319 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.603 141.013 196.123  13.334 353.074  4.664 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.634 188.613 262.037  18.158 471.444  4.909 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.710 379.318 525.878  38.304 946.210  5.496 × 10^{5}
100. TeV 1.000 × 10^{8} 2.735 474.840 657.920  48.710 1184.206  5.684 × 10^{5}