Muons in tantalum (Ta)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
73 (Ta) 180.94788(2) 16.654  718.0 0.17798 2.7623 0.2117 3.4805 5.5262  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.020  4.020  1.438 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.200  3.200  2.564 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.545  2.545  4.688 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.008  2.009  9.168 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.733  1.733  1.456 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.328  1.328  4.171 × 10^{1}
100. MeV 1.764 × 10^{2} 1.256  1.256  5.724 × 10^{1}
140. MeV 2.218 × 10^{2} 1.186  1.186  9.015 × 10^{1}
200. MeV 2.868 × 10^{2} 1.153  1.154  1.416 × 10^{2}
243. MeV 3.325 × 10^{2} 1.149  0.000  1.150 Minimum ionization
300. MeV 3.917 × 10^{2} 1.154  0.000  0.000  1.155  2.285 × 10^{2}
400. MeV 4.945 × 10^{2} 1.172  0.000  0.000  1.173  3.144 × 10^{2}
800. MeV 8.995 × 10^{2} 1.253  0.001  0.000  1.254  6.438 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.285  0.001  0.000  1.287  8.011 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.336  0.002  0.001  1.339  1.106 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.391  0.004  0.001  0.001  1.397  1.544 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.454  0.006  0.003  0.001  1.465  2.241 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.498  0.009  0.006  0.002  1.515  2.912 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.596  0.023  0.021  0.003  1.644  5.436 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.626  0.031  0.030  0.004  1.691  6.636 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.669  0.047  0.048  0.005  1.770  8.947 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.711  0.072  0.079  0.007  1.871  1.224 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.756  0.119  0.139  0.011  2.026  1.737 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.786  0.168  0.204  0.014  2.173  2.214 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.853  0.379  0.492  0.028  2.753  3.845 × 10^{4}
100. GeV 1.001 × 10^{5} 1.873  0.491  0.647  0.035  3.048  4.535 × 10^{4}
140. GeV 1.401 × 10^{5} 1.902  0.721  0.967  0.049  3.640  5.735 × 10^{4}
152. GeV 1.520 × 10^{5} 1.909  0.791  1.065  0.053  3.820 Muon critical energy
200. GeV 2.001 × 10^{5} 1.932  1.081  1.474  0.069  4.557  7.206 × 10^{4}
300. GeV 3.001 × 10^{5} 1.966  1.694  2.319  0.104  6.084  9.100 × 10^{4}
400. GeV 4.001 × 10^{5} 1.990  2.328  3.196  0.138  7.653  1.056 × 10^{5}
800. GeV 8.001 × 10^{5} 2.047  4.944  6.788  0.279  14.060  1.436 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.066  6.287  8.625  0.351  17.330  1.564 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.095  8.978  12.289  0.497  23.860  1.760 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.125  13.092  17.879  0.718  33.817  1.971 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.161  19.958  27.169  1.098  50.387  2.211 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.186  26.913  36.556  1.483  67.140  2.383 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.249  54.943  74.284  3.080 134.557  2.795 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.269  69.063  93.247  3.899 168.480  2.928 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.301  97.226 131.085  5.580 236.193  3.127 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.335 139.708 188.080  8.156 338.280  3.339 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.374 210.432 282.907  12.604 508.319  3.578 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.402 281.398 377.954  17.156 678.912  3.748 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.471 565.656 758.404  36.147 1362.680  4.155 × 10^{5}
100. TeV 1.000 × 10^{8} 2.494 708.010 948.800  45.950 1705.256  4.286 × 10^{5}