Muons in sulfur (S)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
16 (S) 32.065(5)  2.000  180.0 0.33992 2.6456 0.1580 2.7159 4.6659  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.332  6.332  8.825 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.964  4.964  1.603 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.894  3.894  2.983 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.033  3.033  5.933 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.596  2.596  9.520 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.955  1.955  2.783 × 10^{1}
100. MeV 1.764 × 10^{2} 1.840  1.840  3.841 × 10^{1}
140. MeV 2.218 × 10^{2} 1.726  1.727  6.095 × 10^{1}
200. MeV 2.868 × 10^{2} 1.667  1.667  9.645 × 10^{1}
273. MeV 3.633 × 10^{2} 1.652  0.000  1.653 Minimum ionization
300. MeV 3.917 × 10^{2} 1.654  0.000  1.654  1.568 × 10^{2}
400. MeV 4.945 × 10^{2} 1.670  0.000  0.000  1.670  2.170 × 10^{2}
800. MeV 8.995 × 10^{2} 1.759  0.000  0.000  1.760  4.502 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.796  0.000  0.000  1.797  5.627 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.855  0.001  0.000  0.001  1.857  7.815 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.920  0.001  0.001  0.001  1.923  1.099 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.992  0.002  0.001  0.001  1.997  1.608 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.042  0.003  0.002  0.002  2.049  2.102 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.154  0.007  0.007  0.004  2.172  3.991 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.188  0.010  0.010  0.004  2.212  4.903 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.235  0.015  0.016  0.006  2.272  6.686 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.283  0.023  0.026  0.009  2.340  9.286 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.332  0.037  0.046  0.013  2.428  1.348 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.366  0.052  0.067  0.017  2.502  1.753 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.441  0.118  0.161  0.032  2.753  3.275 × 10^{4}
100. GeV 1.001 × 10^{5} 2.465  0.153  0.211  0.040  2.870  3.986 × 10^{4}
140. GeV 1.401 × 10^{5} 2.500  0.226  0.315  0.056  3.097  5.328 × 10^{4}
200. GeV 2.001 × 10^{5} 2.536  0.339  0.480  0.079  3.434  7.167 × 10^{4}
300. GeV 3.001 × 10^{5} 2.578  0.532  0.761  0.118  3.990  9.866 × 10^{4}
400. GeV 4.001 × 10^{5} 2.607  0.733  1.053  0.158  4.551  1.221 × 10^{5}
527. GeV 5.270 × 10^{5} 2.635  0.993  1.434  0.208  5.271 Muon critical energy
800. GeV 8.001 × 10^{5} 2.678  1.564  2.255  0.319  6.816  1.935 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.702  1.992  2.870  0.401  7.965  2.206 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.737  2.852  4.100  0.568  10.257  2.647 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.775  4.170  5.980  0.823  13.748  3.151 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.819  6.375  9.105  1.259  19.558  3.758 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.850  8.613  12.267  1.703  25.435  4.205 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.928  17.655  24.993  3.549  49.125  5.317 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.953  22.219  31.395  4.498  61.066  5.681 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.992  31.331  44.160  6.450  84.933  6.234 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.034  45.098  63.398  9.446 120.976  6.823 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.082  67.988  95.422  14.635 181.128  7.494 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.117  90.974 127.537  19.954 241.583  7.971 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.203 183.132 256.094  42.225 484.654  9.117 × 10^{5}
100. TeV 1.000 × 10^{8} 3.231 229.320 320.440  53.750 606.742  9.485 × 10^{5}