Muons in strontium (Sr)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
38 (Sr) 87.62(1)  2.540  366.0 0.07165 3.4435 0.4585 3.6778 5.9867  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.921  4.921  1.150 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.881  3.882  2.074 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.062  3.062  3.834 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.399  2.399  7.572 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.062  2.062  1.210 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.569  1.569  3.502 × 10^{1}
100. MeV 1.764 × 10^{2} 1.482  1.482  4.816 × 10^{1}
140. MeV 2.218 × 10^{2} 1.398  1.398  7.608 × 10^{1}
200. MeV 2.868 × 10^{2} 1.358  1.358  1.198 × 10^{2}
237. MeV 3.260 × 10^{2} 1.353  1.354 Minimum ionization
300. MeV 3.917 × 10^{2} 1.359  0.000  0.000  1.359  1.936 × 10^{2}
400. MeV 4.945 × 10^{2} 1.380  0.000  0.000  1.381  2.666 × 10^{2}
800. MeV 8.995 × 10^{2} 1.471  0.001  0.000  1.472  5.467 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.507  0.001  0.000  1.509  6.808 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.564  0.001  0.000  0.001  1.566  9.408 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.624  0.002  0.001  0.001  1.629  1.316 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.692  0.004  0.003  0.001  1.700  1.916 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.739  0.006  0.004  0.002  1.751  2.495 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.844  0.014  0.014  0.003  1.875  4.694 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.875  0.018  0.019  0.004  1.917  5.749 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.920  0.028  0.031  0.006  1.985  7.798 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.965  0.043  0.050  0.008  2.066  1.076 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.012  0.070  0.087  0.012  2.181  1.547 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.043  0.099  0.128  0.015  2.286  1.994 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.113  0.224  0.305  0.030  2.673  3.609 × 10^{4}
100. GeV 1.001 × 10^{5} 2.134  0.291  0.401  0.037  2.864  4.332 × 10^{4}
140. GeV 1.401 × 10^{5} 2.165  0.427  0.599  0.052  3.244  5.644 × 10^{4}
200. GeV 2.001 × 10^{5} 2.198  0.640  0.912  0.073  3.824  7.346 × 10^{4}
265. GeV 2.651 × 10^{5} 2.223  0.875  1.250  0.097  4.446 Muon critical energy
300. GeV 3.001 × 10^{5} 2.234  1.004  1.436  0.110  4.785  9.680 × 10^{4}
400. GeV 4.001 × 10^{5} 2.259  1.381  1.979  0.147  5.767  1.158 × 10^{5}
800. GeV 8.001 × 10^{5} 2.321  2.938  4.208  0.297  9.765  1.685 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.342  3.738  5.349  0.373  11.802  1.871 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.372  5.343  7.626  0.528  15.870  2.163 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.405  7.799  11.101  0.764  22.071  2.482 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.443  11.902  16.877  1.169  32.392  2.854 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.471  16.062  22.716  1.580  42.829  3.122 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.538  32.842  46.191  3.284  84.857  3.772 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.560  41.301  57.994  4.160 106.016  3.983 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.594  58.173  81.542  5.958 148.268  4.300 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.630  83.638 117.018  8.714 212.001  4.637 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.672 126.032 176.047  13.479 318.231  5.020 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.702 168.586 235.222  18.357 424.869  5.291 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.777 339.085 472.087  38.739 852.688  5.942 × 10^{5}
100. TeV 1.000 × 10^{8} 2.802 424.490 590.630  49.270 1067.193  6.151 × 10^{5}