Muons in striated muscle (ICRU)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.55005 1.040 74.7 0.08507 3.5383 0.2249 2.8032 3.4636 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.897 7.897 6.998 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.160 6.160 1.279 × 10^0 20.0 MeV 6.802 × 10^1 4.810 4.810 2.394 × 10^0 30.0 MeV 8.509 × 10^1 3.732 3.732 4.788 × 10^0 40.0 MeV 1.003 × 10^2 3.187 3.187 7.707 × 10^0 80.0 MeV 1.527 × 10^2 2.392 2.392 2.266 × 10^1 100. MeV 1.764 × 10^2 2.250 2.250 3.130 × 10^1 140. MeV 2.218 × 10^2 2.096 2.096 4.980 × 10^1 200. MeV 2.868 × 10^2 2.007 2.007 7.917 × 10^1 300. MeV 3.917 × 10^2 1.973 0.000 1.974 1.296 × 10^2 318. MeV 4.105 × 10^2 1.973 0.000 1.973 Minimum ionization 400. MeV 4.945 × 10^2 1.980 0.000 1.980 1.802 × 10^2 800. MeV 8.995 × 10^2 2.054 0.000 0.000 2.055 3.786 × 10^2 1.00 GeV 1.101 × 10^3 2.088 0.000 0.000 2.089 4.751 × 10^2 1.40 GeV 1.502 × 10^3 2.144 0.000 0.001 2.145 6.639 × 10^2 2.00 GeV 2.103 × 10^3 2.205 0.001 0.000 0.001 2.207 9.394 × 10^2 3.00 GeV 3.104 × 10^3 2.275 0.001 0.001 0.001 2.278 1.385 × 10^3 4.00 GeV 4.104 × 10^3 2.323 0.001 0.001 0.002 2.328 1.819 × 10^3 8.00 GeV 8.105 × 10^3 2.434 0.004 0.003 0.004 2.445 3.491 × 10^3 10.0 GeV 1.011 × 10^4 2.468 0.005 0.005 0.005 2.482 4.302 × 10^3 14.0 GeV 1.411 × 10^4 2.516 0.007 0.008 0.007 2.538 5.895 × 10^3 20.0 GeV 2.011 × 10^4 2.566 0.011 0.013 0.009 2.599 8.229 × 10^3 30.0 GeV 3.011 × 10^4 2.619 0.018 0.023 0.014 2.674 1.202 × 10^4 40.0 GeV 4.011 × 10^4 2.655 0.026 0.033 0.018 2.732 1.572 × 10^4 80.0 GeV 8.011 × 10^4 2.738 0.060 0.080 0.034 2.912 2.987 × 10^4 100. GeV 1.001 × 10^5 2.764 0.077 0.106 0.042 2.990 3.665 × 10^4 140. GeV 1.401 × 10^5 2.802 0.114 0.159 0.059 3.135 4.971 × 10^4 200. GeV 2.001 × 10^5 2.843 0.172 0.243 0.084 3.342 6.825 × 10^4 300. GeV 3.001 × 10^5 2.888 0.271 0.386 0.125 3.672 9.678 × 10^4 400. GeV 4.001 × 10^5 2.921 0.374 0.535 0.167 3.998 1.229 × 10^5 800. GeV 8.001 × 10^5 2.999 0.804 1.156 0.338 5.298 2.095 × 10^5 1.00 TeV 1.000 × 10^6 3.025 1.026 1.477 0.424 5.953 2.451 × 10^5 1.03 TeV 1.033 × 10^6 3.029 1.061 1.529 0.439 6.058 Muon critical energy 1.40 TeV 1.400 × 10^6 3.064 1.472 2.116 0.602 7.254 3.059 × 10^5 2.00 TeV 2.000 × 10^6 3.106 2.159 3.094 0.872 9.231 3.790 × 10^5 3.00 TeV 3.000 × 10^6 3.154 3.310 4.723 1.336 12.523 4.717 × 10^5 4.00 TeV 4.000 × 10^6 3.189 4.481 6.374 1.807 15.852 5.425 × 10^5 8.00 TeV 8.000 × 10^6 3.274 9.223 13.026 3.773 29.296 7.253 × 10^5 10.0 TeV 1.000 × 10^7 3.302 11.621 16.376 4.785 36.084 7.868 × 10^5 14.0 TeV 1.400 × 10^7 3.345 16.407 23.051 6.871 49.674 8.809 × 10^5 20.0 TeV 2.000 × 10^7 3.391 23.648 33.119 10.076 70.234 9.820 × 10^5 30.0 TeV 3.000 × 10^7 3.444 35.704 49.870 15.639 104.657 1.098 × 10^6 40.0 TeV 4.000 × 10^7 3.483 47.825 66.675 21.348 139.332 1.180 × 10^6 80.0 TeV 8.000 × 10^7 3.578 96.441 133.953 45.312 279.283 1.379 × 10^6 100. TeV 1.000 × 10^8 3.609 120.819 167.631 57.734 349.793 1.443 × 10^6