Muons in sodium (Na)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
11 (Na)22.98976928(2) 0.971  149.0 0.07772 3.6452 0.2880 3.1962 5.0526  0.08
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.245  6.245  8.929 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.891  4.891  1.624 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.833  3.833  3.026 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.985  2.985  6.023 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.554  2.554  9.668 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.926  1.926  2.827 × 10^{1}
100. MeV 1.764 × 10^{2} 1.813  1.813  3.900 × 10^{1}
140. MeV 2.218 × 10^{2} 1.704  1.704  6.186 × 10^{1}
200. MeV 2.868 × 10^{2} 1.650  1.650  9.776 × 10^{1}
263. MeV 3.527 × 10^{2} 1.639  0.000  1.639 Minimum ionization
300. MeV 3.917 × 10^{2} 1.641  0.000  1.641  1.587 × 10^{2}
400. MeV 4.945 × 10^{2} 1.658  0.000  1.659  2.193 × 10^{2}
800. MeV 8.995 × 10^{2} 1.747  0.000  0.000  1.747  4.541 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.783  0.000  0.000  1.784  5.674 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.840  0.000  0.000  0.001  1.841  7.879 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.901  0.001  0.000  0.001  1.903  1.108 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.969  0.001  0.001  0.001  1.973  1.623 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.016  0.002  0.002  0.002  2.022  2.124 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.122  0.005  0.005  0.004  2.135  4.042 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.153  0.007  0.007  0.005  2.171  4.971 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.198  0.010  0.011  0.006  2.226  6.789 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.244  0.015  0.018  0.009  2.286  9.447 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.292  0.025  0.031  0.013  2.361  1.375 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.324  0.036  0.046  0.017  2.422  1.793 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.397  0.081  0.110  0.033  2.621  3.377 × 10^{4}
100. GeV 1.001 × 10^{5} 2.419  0.105  0.145  0.041  2.711  4.128 × 10^{4}
140. GeV 1.401 × 10^{5} 2.453  0.155  0.217  0.057  2.882  5.558 × 10^{4}
200. GeV 2.001 × 10^{5} 2.488  0.233  0.331  0.081  3.133  7.554 × 10^{4}
300. GeV 3.001 × 10^{5} 2.528  0.367  0.524  0.121  3.540  1.055 × 10^{5}
400. GeV 4.001 × 10^{5} 2.556  0.505  0.725  0.161  3.948  1.323 × 10^{5}
712. GeV 7.119 × 10^{5} 2.613  0.951  1.372  0.289  5.226 Muon critical energy
800. GeV 8.001 × 10^{5} 2.624  1.080  1.559  0.326  5.590  2.170 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.647  1.377  1.990  0.409  6.423  2.504 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.681  1.973  2.844  0.580  8.078  3.058 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.717  2.888  4.151  0.840  10.597  3.705 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.759  4.420  6.326  1.286  14.792  4.500 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.789  5.976  8.530  1.740  19.035  5.095 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.863  12.267  17.398  3.628  36.157  6.594 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.888  15.445  21.861  4.600  44.794  7.090 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.925  21.790  30.758  6.599  62.072  7.845 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.965  31.380  44.172  9.668  88.186  8.652 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.011  47.326  66.497  14.989 131.824  9.574 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.045  63.344  88.889  20.447 175.725  1.023 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.127 127.579 178.524  43.311 352.543  1.180 × 10^{6}
100. TeV 1.000 × 10^{8} 3.155 159.780 223.390  55.150 441.475  1.231 × 10^{6}