Muons in skeletal muscle (ICRP)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.54938 1.040 75.3 0.08636 3.5330 0.2282 2.7999 3.4809 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.879 7.879 7.015 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.146 6.146 1.282 × 10^0 20.0 MeV 6.802 × 10^1 4.800 4.800 2.400 × 10^0 30.0 MeV 8.509 × 10^1 3.724 3.724 4.798 × 10^0 40.0 MeV 1.003 × 10^2 3.180 3.180 7.723 × 10^0 80.0 MeV 1.527 × 10^2 2.387 2.387 2.270 × 10^1 100. MeV 1.764 × 10^2 2.246 2.246 3.136 × 10^1 140. MeV 2.218 × 10^2 2.092 2.092 4.990 × 10^1 200. MeV 2.868 × 10^2 2.004 2.004 7.932 × 10^1 300. MeV 3.917 × 10^2 1.970 0.000 1.971 1.298 × 10^2 318. MeV 4.105 × 10^2 1.970 0.000 1.970 Minimum ionization 400. MeV 4.945 × 10^2 1.977 0.000 1.977 1.805 × 10^2 800. MeV 8.995 × 10^2 2.052 0.000 0.000 2.052 3.791 × 10^2 1.00 GeV 1.101 × 10^3 2.086 0.000 0.000 2.086 4.758 × 10^2 1.40 GeV 1.502 × 10^3 2.141 0.000 0.001 2.142 6.649 × 10^2 2.00 GeV 2.103 × 10^3 2.202 0.001 0.000 0.001 2.204 9.407 × 10^2 3.00 GeV 3.104 × 10^3 2.272 0.001 0.001 0.001 2.275 1.387 × 10^3 4.00 GeV 4.104 × 10^3 2.320 0.001 0.001 0.002 2.325 1.821 × 10^3 8.00 GeV 8.105 × 10^3 2.431 0.004 0.003 0.004 2.442 3.495 × 10^3 10.0 GeV 1.011 × 10^4 2.465 0.005 0.005 0.005 2.479 4.308 × 10^3 14.0 GeV 1.411 × 10^4 2.513 0.007 0.008 0.007 2.535 5.902 × 10^3 20.0 GeV 2.011 × 10^4 2.563 0.011 0.013 0.009 2.596 8.239 × 10^3 30.0 GeV 3.011 × 10^4 2.616 0.018 0.023 0.013 2.670 1.203 × 10^4 40.0 GeV 4.011 × 10^4 2.652 0.026 0.033 0.018 2.729 1.574 × 10^4 80.0 GeV 8.011 × 10^4 2.735 0.060 0.080 0.034 2.909 2.991 × 10^4 100. GeV 1.001 × 10^5 2.761 0.077 0.106 0.042 2.986 3.670 × 10^4 140. GeV 1.401 × 10^5 2.799 0.114 0.159 0.059 3.131 4.977 × 10^4 200. GeV 2.001 × 10^5 2.839 0.172 0.243 0.084 3.338 6.833 × 10^4 300. GeV 3.001 × 10^5 2.885 0.271 0.386 0.125 3.667 9.689 × 10^4 400. GeV 4.001 × 10^5 2.917 0.374 0.535 0.167 3.993 1.230 × 10^5 800. GeV 8.001 × 10^5 2.996 0.803 1.155 0.337 5.292 2.097 × 10^5 1.00 TeV 1.000 × 10^6 3.021 1.025 1.476 0.424 5.946 2.454 × 10^5 1.03 TeV 1.032 × 10^6 3.025 1.060 1.527 0.438 6.051 Muon critical energy 1.40 TeV 1.400 × 10^6 3.060 1.471 2.114 0.601 7.246 3.062 × 10^5 2.00 TeV 2.000 × 10^6 3.102 2.157 3.091 0.870 9.221 3.795 × 10^5 3.00 TeV 3.000 × 10^6 3.150 3.307 4.719 1.333 12.509 4.723 × 10^5 4.00 TeV 4.000 × 10^6 3.185 4.477 6.369 1.803 15.834 5.432 × 10^5 8.00 TeV 8.000 × 10^6 3.270 9.214 13.014 3.764 29.263 7.262 × 10^5 10.0 TeV 1.000 × 10^7 3.298 11.610 16.361 4.774 36.044 7.876 × 10^5 14.0 TeV 1.400 × 10^7 3.341 16.392 23.030 6.855 49.619 8.818 × 10^5 20.0 TeV 2.000 × 10^7 3.387 23.625 33.089 10.053 70.154 9.831 × 10^5 30.0 TeV 3.000 × 10^7 3.440 35.670 49.825 15.603 104.539 1.099 × 10^6 40.0 TeV 4.000 × 10^7 3.479 47.779 66.615 21.300 139.173 1.182 × 10^6 80.0 TeV 8.000 × 10^7 3.573 96.349 133.832 45.207 278.961 1.381 × 10^6 100. TeV 1.000 × 10^8 3.605 120.703 167.479 57.600 349.388 1.445 × 10^6