Muons in silver (Ag)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
47 (Ag) 107.8682(2) 10.500  470.0 0.24585 2.6899 0.0657 3.1074 5.0630  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.721  4.721  1.206 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.732  3.733  2.168 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.950  2.950  3.996 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.314  2.314  7.874 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.988  1.988  1.257 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.513  1.513  3.634 × 10^{1}
100. MeV 1.764 × 10^{2} 1.428  1.428  4.998 × 10^{1}
140. MeV 2.218 × 10^{2} 1.346  1.346  7.896 × 10^{1}
200. MeV 2.868 × 10^{2} 1.305  1.306  1.244 × 10^{2}
253. MeV 3.431 × 10^{2} 1.299  1.299 Minimum ionization
300. MeV 3.917 × 10^{2} 1.303  0.000  0.000  1.303  2.012 × 10^{2}
400. MeV 4.945 × 10^{2} 1.321  0.000  0.000  1.321  2.775 × 10^{2}
800. MeV 8.995 × 10^{2} 1.404  0.001  0.000  1.405  5.707 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.438  0.001  0.000  1.440  7.113 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.492  0.002  0.000  0.001  1.495  9.837 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.550  0.003  0.001  0.001  1.555  1.377 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.616  0.005  0.003  0.001  1.625  2.005 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.662  0.007  0.005  0.002  1.676  2.610 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.765  0.017  0.016  0.003  1.802  4.903 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.796  0.022  0.023  0.004  1.845  6.000 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.840  0.034  0.037  0.005  1.917  8.125 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.884  0.053  0.060  0.008  2.005  1.118 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.930  0.086  0.105  0.011  2.134  1.601 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.961  0.121  0.154  0.015  2.252  2.057 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.029  0.274  0.370  0.029  2.703  3.675 × 10^{4}
100. GeV 1.001 × 10^{5} 2.050  0.355  0.486  0.036  2.928  4.386 × 10^{4}
140. GeV 1.401 × 10^{5} 2.081  0.521  0.725  0.051  3.379  5.657 × 10^{4}
200. GeV 2.001 × 10^{5} 2.113  0.781  1.103  0.072  4.071  7.273 × 10^{4}
215. GeV 2.149 × 10^{5} 2.119  0.846  1.196  0.078  4.239 Muon critical energy
300. GeV 3.001 × 10^{5} 2.149  1.226  1.737  0.108  5.221  9.438 × 10^{4}
400. GeV 4.001 × 10^{5} 2.175  1.685  2.393  0.144  6.398  1.117 × 10^{5}
800. GeV 8.001 × 10^{5} 2.237  3.582  5.084  0.292  11.195  1.583 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.257  4.557  6.460  0.367  13.642  1.745 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.288  6.511  9.207  0.519  18.527  1.996 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.321  9.501  13.399  0.751  25.974  2.268 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.359  14.493  20.366  1.149  38.369  2.583 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.387  19.553  27.407  1.553  50.901  2.809 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.454  39.957  55.715  3.227 101.354  3.355 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.477  50.241  69.945  4.086 126.750  3.531 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.511  70.753  98.337  5.851 177.453  3.796 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.547 101.706 141.108  8.556 253.918  4.078 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.589 153.235 212.274  13.231 381.330  4.397 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.620 204.952 283.611  18.017 509.201  4.623 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.695 412.144 569.156  37.999 1021.995  5.166 × 10^{5}
100. TeV 1.000 × 10^{8} 2.720 515.920 712.060  48.320 1279.021  5.341 × 10^{5}