Muons in silicon (Si)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
14 (Si) 28.0855(3)  2.329  173.0 0.14921 3.2546 0.2015 2.8716 4.4355  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.363  6.363  8.779 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.987  4.987  1.595 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.912  3.912  2.969 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.047  3.047  5.905 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.608  2.608  9.476 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.965  1.965  2.770 × 10^{1}
100. MeV 1.764 × 10^{2} 1.849  1.849  3.822 × 10^{1}
140. MeV 2.218 × 10^{2} 1.737  1.737  6.064 × 10^{1}
200. MeV 2.868 × 10^{2} 1.678  1.678  9.590 × 10^{1}
273. MeV 3.633 × 10^{2} 1.664  0.000  1.664 Minimum ionization
300. MeV 3.917 × 10^{2} 1.665  0.000  1.666  1.559 × 10^{2}
400. MeV 4.945 × 10^{2} 1.681  0.000  1.681  2.157 × 10^{2}
800. MeV 8.995 × 10^{2} 1.767  0.000  0.000  1.768  4.475 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.803  0.000  0.000  1.804  5.595 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.860  0.001  0.000  0.001  1.862  7.776 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.922  0.001  0.001  0.001  1.924  1.094 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.991  0.002  0.001  0.001  1.995  1.604 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.038  0.003  0.002  0.002  2.045  2.099 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.145  0.006  0.006  0.004  2.162  3.994 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.177  0.009  0.009  0.005  2.199  4.911 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.224  0.013  0.014  0.006  2.257  6.705 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.270  0.020  0.023  0.009  2.322  9.325 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.319  0.033  0.040  0.013  2.405  1.355 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.352  0.046  0.059  0.017  2.474  1.765 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.427  0.105  0.142  0.033  2.707  3.308 × 10^{4}
100. GeV 1.001 × 10^{5} 2.451  0.136  0.187  0.040  2.814  4.033 × 10^{4}
140. GeV 1.401 × 10^{5} 2.485  0.200  0.279  0.056  3.021  5.404 × 10^{4}
200. GeV 2.001 × 10^{5} 2.522  0.300  0.425  0.080  3.328  7.295 × 10^{4}
300. GeV 3.001 × 10^{5} 2.563  0.472  0.675  0.119  3.831  1.009 × 10^{5}
400. GeV 4.001 × 10^{5} 2.593  0.651  0.935  0.159  4.338  1.255 × 10^{5}
582. GeV 5.816 × 10^{5} 2.631  0.982  1.417  0.232  5.263 Muon critical energy
800. GeV 8.001 × 10^{5} 2.664  1.389  2.003  0.322  6.379  2.010 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.687  1.770  2.551  0.404  7.413  2.301 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.723  2.535  3.645  0.573  9.476  2.777 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.760  3.708  5.319  0.830  12.617  3.324 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.804  5.670  8.101  1.270  17.846  3.988 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.836  7.662  10.917  1.718  23.134  4.478 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.913  15.713  22.251  3.581  44.458  5.704 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.938  19.777  27.954  4.539  55.209  6.107 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.977  27.892  39.323  6.510  76.704  6.719 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.019  40.156  56.460  9.536 109.172  7.372 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.067  60.546  84.985  14.778 163.376  8.116 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.102  81.023 113.592  20.152 217.870  8.644 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.188 163.133 228.110  42.660 437.091  9.915 × 10^{5}
100. TeV 1.000 × 10^{8} 3.216 204.290 285.430  54.310 547.247  1.032 × 10^{6}