Muons in shielding concrete

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.50274 & 2.300 & 135.2 & 0.07515 & 3.5467 & 0.1301 & 3.0466 & 3.9464 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.664  6.664  8.343 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.214  5.214  1.520 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.084  4.084  2.835 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.178  3.178  5.649 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.719  2.719  9.073 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.049  2.049  2.655 × 10^{1}
100. MeV 1.764 × 10^{2} 1.925  1.925  3.664 × 10^{1}
140. MeV 2.218 × 10^{2} 1.801  1.801  5.822 × 10^{1}
200. MeV 2.868 × 10^{2} 1.732  1.732  9.232 × 10^{1}
293. MeV 3.844 × 10^{2} 1.711  0.000  1.711 Minimum ionization
300. MeV 3.917 × 10^{2} 1.711  0.000  1.711  1.506 × 10^{2}
400. MeV 4.945 × 10^{2} 1.722  0.000  1.722  2.089 × 10^{2}
800. MeV 8.995 × 10^{2} 1.800  0.000  0.000  1.801  4.360 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.834  0.000  0.000  1.834  5.460 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.888  0.001  0.000  0.001  1.889  7.607 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.947  0.001  0.000  0.001  1.949  1.073 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.014  0.001  0.001  0.001  2.018  1.577 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.060  0.002  0.002  0.002  2.066  2.066 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.165  0.005  0.005  0.004  2.179  3.945 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.197  0.007  0.007  0.005  2.216  4.855 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.243  0.010  0.011  0.006  2.271  6.637 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.289  0.016  0.019  0.009  2.333  9.242 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.338  0.027  0.033  0.013  2.411  1.346 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.372  0.038  0.048  0.017  2.474  1.755 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.448  0.085  0.115  0.033  2.682  3.305 × 10^{4}
100. GeV 1.001 × 10^{5} 2.472  0.110  0.151  0.041  2.775  4.038 × 10^{4}
140. GeV 1.401 × 10^{5} 2.507  0.162  0.226  0.057  2.953  5.435 × 10^{4}
200. GeV 2.001 × 10^{5} 2.544  0.244  0.346  0.081  3.215  7.382 × 10^{4}
300. GeV 3.001 × 10^{5} 2.586  0.384  0.548  0.122  3.639  1.030 × 10^{5}
400. GeV 4.001 × 10^{5} 2.615  0.529  0.759  0.162  4.065  1.290 × 10^{5}
700. GeV 7.005 × 10^{5} 2.673  0.978  1.409  0.286  5.347 Muon critical energy
800. GeV 8.001 × 10^{5} 2.687  1.130  1.629  0.328  5.774  2.112 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.711  1.441  2.077  0.412  6.640  2.434 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.746  2.065  2.969  0.583  8.364  2.970 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.784  3.022  4.335  0.845  10.987  3.594 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.828  4.624  6.607  1.294  15.354  4.361 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.860  6.252  8.908  1.750  19.770  4.934 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.938  12.832  18.169  3.650  37.589  6.376 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.964  16.155  22.831  4.627  46.577  6.854 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.003  22.789  32.122  6.640  64.554  7.580 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.045  32.815  46.131  9.730  91.721  8.356 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.094  49.496  69.444  15.087 137.121  9.242 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.129  66.253  92.826  20.582 182.791  9.871 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.216 133.445 186.432  43.612 366.705  1.139 × 10^{6}
100. TeV 1.000 × 10^{8} 3.244 167.127 233.286  55.538 459.196  1.187 × 10^{6}