Muons in selenium (Se)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
34 (Se) 78.971(8)  4.500  348.0 0.06568 3.4317 0.2258 3.6264 5.3210  0.10
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.926  4.926  1.148 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.883  3.883  2.072 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.061  3.061  3.831 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.397  2.397  7.572 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.059  2.059  1.210 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.564  1.564  3.508 × 10^{1}
100. MeV 1.764 × 10^{2} 1.476  1.476  4.827 × 10^{1}
140. MeV 2.218 × 10^{2} 1.391  1.392  7.631 × 10^{1}
200. MeV 2.868 × 10^{2} 1.350  1.350  1.202 × 10^{2}
252. MeV 3.421 × 10^{2} 1.343  0.000  1.343 Minimum ionization
300. MeV 3.917 × 10^{2} 1.346  0.000  0.000  1.347  1.946 × 10^{2}
400. MeV 4.945 × 10^{2} 1.364  0.000  0.000  1.364  2.684 × 10^{2}
800. MeV 8.995 × 10^{2} 1.447  0.001  0.000  1.448  5.527 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.480  0.001  0.000  1.481  6.893 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.533  0.001  0.000  0.001  1.535  9.543 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.590  0.002  0.001  0.001  1.594  1.337 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.655  0.003  0.002  0.001  1.662  1.951 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.699  0.005  0.004  0.002  1.710  2.544 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.800  0.012  0.012  0.003  1.828  4.798 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.830  0.016  0.017  0.004  1.868  5.880 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.873  0.025  0.028  0.006  1.932  7.984 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.916  0.039  0.045  0.008  2.008  1.103 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.962  0.063  0.078  0.012  2.116  1.588 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.993  0.089  0.115  0.015  2.212  2.050 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.061  0.201  0.275  0.030  2.568  3.725 × 10^{4}
100. GeV 1.001 × 10^{5} 2.082  0.261  0.361  0.037  2.742  4.478 × 10^{4}
140. GeV 1.401 × 10^{5} 2.113  0.383  0.539  0.052  3.087  5.853 × 10^{4}
200. GeV 2.001 × 10^{5} 2.145  0.574  0.821  0.074  3.614  7.648 × 10^{4}
285. GeV 2.850 × 10^{5} 2.176  0.850  1.220  0.105  4.353 Muon critical energy
300. GeV 3.001 × 10^{5} 2.180  0.901  1.293  0.111  4.485  1.013 × 10^{5}
400. GeV 4.001 × 10^{5} 2.206  1.239  1.782  0.148  5.375  1.216 × 10^{5}
800. GeV 8.001 × 10^{5} 2.267  2.636  3.790  0.299  8.993  1.786 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.287  3.354  4.818  0.376  10.837  1.988 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.318  4.796  6.869  0.533  14.517  2.306 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.351  7.002  10.002  0.771  20.127  2.655 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.388  10.688  15.208  1.179  29.465  3.064 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.416  14.426  20.472  1.593  38.907  3.358 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.482  29.504  41.637  3.313  76.938  4.075 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.504  37.107  52.279  4.197  96.088  4.308 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.538  52.272  73.510  6.011 134.332  4.658 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.574  75.162 105.498  8.792 192.027  5.030 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.616 113.270 158.722  13.602 288.211  5.452 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.646 151.525 212.079  18.528 384.780  5.751 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.720 304.806 425.659  39.107 772.293  6.471 × 10^{5}
100. TeV 1.000 × 10^{8} 2.745 381.590 532.550  49.740 966.626  6.702 × 10^{5}