Muons in scandium (Sc)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
21 (Sc) 44.955908(5) 2.989  216.0 0.15754 3.0517 0.1640 3.0593 4.6949  0.10
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.769  5.770  9.712 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.529  4.529  1.762 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.557  3.557  3.273 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.775  2.775  6.499 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.377  2.377  1.042 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.796  1.796  3.038 × 10^{1}
100. MeV 1.764 × 10^{2} 1.692  1.692  4.188 × 10^{1}
140. MeV 2.218 × 10^{2} 1.588  1.588  6.640 × 10^{1}
200. MeV 2.868 × 10^{2} 1.534  1.535  1.050 × 10^{2}
267. MeV 3.577 × 10^{2} 1.522  0.000  1.522 Minimum ionization
300. MeV 3.917 × 10^{2} 1.523  0.000  1.524  1.705 × 10^{2}
400. MeV 4.945 × 10^{2} 1.539  0.000  0.000  1.539  2.359 × 10^{2}
800. MeV 8.995 × 10^{2} 1.622  0.000  0.000  1.623  4.888 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.656  0.001  0.000  1.657  6.108 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.711  0.001  0.000  0.001  1.713  8.480 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.771  0.001  0.001  0.001  1.774  1.192 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.838  0.002  0.002  0.001  1.844  1.744 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.884  0.004  0.003  0.002  1.893  2.279 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.989  0.009  0.009  0.004  2.010  4.322 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.020  0.011  0.012  0.004  2.048  5.308 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.065  0.017  0.019  0.006  2.108  7.231 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.110  0.027  0.032  0.008  2.178  1.003 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.158  0.044  0.055  0.012  2.270  1.452 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.189  0.062  0.080  0.016  2.349  1.885 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.261  0.141  0.193  0.031  2.627  3.493 × 10^{4}
100. GeV 1.001 × 10^{5} 2.283  0.183  0.253  0.039  2.759  4.236 × 10^{4}
140. GeV 1.401 × 10^{5} 2.316  0.269  0.379  0.054  3.018  5.621 × 10^{4}
200. GeV 2.001 × 10^{5} 2.350  0.403  0.578  0.077  3.409  7.491 × 10^{4}
300. GeV 3.001 × 10^{5} 2.389  0.634  0.912  0.116  4.051  1.018 × 10^{5}
400. GeV 4.001 × 10^{5} 2.416  0.872  1.258  0.154  4.702  1.247 × 10^{5}
422. GeV 4.217 × 10^{5} 2.421  0.924  1.334  0.163  4.844 Muon critical energy
800. GeV 8.001 × 10^{5} 2.483  1.859  2.684  0.312  7.338  1.923 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.505  2.367  3.414  0.392  8.679  2.173 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.538  3.387  4.873  0.555  11.355  2.575 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.574  4.950  7.103  0.804  15.431  3.026 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.615  7.563  10.809  1.230  22.217  3.564 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.644  10.214  14.558  1.663  29.080  3.956 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.716  20.918  29.639  3.463  56.736  4.923 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.740  26.318  37.224  4.388  70.671  5.238 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.777  37.100  52.355  6.290  98.522  5.716 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.816  53.386  75.158  9.208 140.569  6.223 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.861  80.465 113.098  14.258 210.683  6.800 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.894 107.653 151.139  19.433 281.119  7.210 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.974 216.637 303.421  41.077 564.110  8.194 × 10^{5}
100. TeV 1.000 × 10^{8} 3.001 271.250 379.640  52.270 706.161  8.511 × 10^{5}