Muons in samarium (Sm)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
62 (Sm) 150.36(2)  7.520  574.0 0.24698 2.6403 0.1503 3.3443 5.8517  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.306  4.306  1.330 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.414  3.414  2.383 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.705  2.705  4.379 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.127  2.127  8.602 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.831  1.831  1.370 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.397  1.397  3.946 × 10^{1}
100. MeV 1.764 × 10^{2} 1.321  1.321  5.422 × 10^{1}
140. MeV 2.218 × 10^{2} 1.248  1.248  8.550 × 10^{1}
200. MeV 2.868 × 10^{2} 1.214  1.214  1.344 × 10^{2}
240. MeV 3.294 × 10^{2} 1.210  0.000  1.211 Minimum ionization
300. MeV 3.917 × 10^{2} 1.215  0.000  0.000  1.216  2.169 × 10^{2}
400. MeV 4.945 × 10^{2} 1.235  0.000  0.000  1.235  2.985 × 10^{2}
800. MeV 8.995 × 10^{2} 1.319  0.001  0.000  1.321  6.113 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.353  0.001  0.000  1.355  7.607 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.407  0.002  0.000  0.001  1.410  1.050 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.465  0.003  0.001  0.001  1.470  1.466 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.531  0.006  0.003  0.001  1.541  2.129 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.576  0.008  0.006  0.002  1.592  2.767 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.679  0.020  0.019  0.003  1.722  5.173 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.710  0.027  0.027  0.004  1.768  6.319 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.754  0.041  0.044  0.005  1.845  8.531 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.798  0.064  0.072  0.007  1.942  1.170 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.845  0.105  0.125  0.011  2.086  1.666 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.876  0.148  0.184  0.015  2.222  2.131 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.943  0.334  0.441  0.029  2.748  3.745 × 10^{4}
100. GeV 1.001 × 10^{5} 1.964  0.432  0.581  0.035  3.013  4.440 × 10^{4}
140. GeV 1.401 × 10^{5} 1.993  0.635  0.867  0.049  3.545  5.663 × 10^{4}
175. GeV 1.755 × 10^{5} 2.013  0.820  1.131  0.062  4.027 Muon critical energy
200. GeV 2.001 × 10^{5} 2.024  0.951  1.320  0.070  4.367  7.186 × 10^{4}
300. GeV 3.001 × 10^{5} 2.058  1.492  2.077  0.105  5.733  9.180 × 10^{4}
400. GeV 4.001 × 10^{5} 2.083  2.050  2.861  0.140  7.136  1.074 × 10^{5}
800. GeV 8.001 × 10^{5} 2.142  4.356  6.077  0.284  12.859  1.486 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.161  5.540  7.721  0.357  15.780  1.626 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.190  7.913  11.002  0.505  21.611  1.842 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.221  11.542  16.007  0.730  30.502  2.075 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.257  17.599  24.325  1.116  45.299  2.342 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.283  23.737  32.730  1.508  60.260  2.533 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.347  48.476  66.516  3.133 120.474  2.993 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.368  60.940  83.498  3.967 150.775  3.141 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.401  85.801 117.383  5.678 211.265  3.364 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.435 123.308 168.426  8.300 302.471  3.600 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.475 185.749 253.353  12.830 454.409  3.868 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.504 248.410 338.480  17.465 606.861  4.058 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.575 499.414 679.212  36.812 1218.014  4.514 × 10^{5}
100. TeV 1.000 × 10^{8} 2.598 625.120 849.730  46.800 1524.250  4.661 × 10^{5}