Muons in ruthenium (Ru)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
44 (Ru) 101.07(2)  12.410  441.0 0.19342 2.8707 0.0599 3.0834 4.7694  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.772  4.772  1.191 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.770  3.770  2.143 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.977  2.977  3.954 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.334  2.334  7.798 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.005  2.005  1.245 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.524  1.524  3.604 × 10^{1}
100. MeV 1.764 × 10^{2} 1.439  1.439  4.958 × 10^{1}
140. MeV 2.218 × 10^{2} 1.355  1.355  7.835 × 10^{1}
200. MeV 2.868 × 10^{2} 1.314  1.314  1.235 × 10^{2}
253. MeV 3.431 × 10^{2} 1.307  1.307 Minimum ionization
300. MeV 3.917 × 10^{2} 1.310  0.000  0.000  1.310  1.999 × 10^{2}
400. MeV 4.945 × 10^{2} 1.327  0.000  0.000  1.327  2.757 × 10^{2}
800. MeV 8.995 × 10^{2} 1.408  0.001  0.000  1.409  5.679 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.441  0.001  0.000  1.443  7.081 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.494  0.002  0.000  0.001  1.496  9.800 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.551  0.003  0.001  0.001  1.555  1.373 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.615  0.004  0.003  0.001  1.623  2.001 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.659  0.006  0.005  0.002  1.672  2.608 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.759  0.016  0.016  0.003  1.794  4.909 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.789  0.021  0.022  0.004  1.836  6.011 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.831  0.032  0.035  0.005  1.904  8.149 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.874  0.049  0.057  0.008  1.989  1.123 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.919  0.081  0.099  0.011  2.112  1.611 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.949  0.114  0.146  0.015  2.225  2.072 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.017  0.258  0.349  0.030  2.654  3.715 × 10^{4}
100. GeV 1.001 × 10^{5} 2.037  0.334  0.458  0.037  2.867  4.440 × 10^{4}
140. GeV 1.401 × 10^{5} 2.068  0.490  0.684  0.051  3.294  5.741 × 10^{4}
200. GeV 2.001 × 10^{5} 2.100  0.735  1.041  0.073  3.949  7.402 × 10^{4}
225. GeV 2.254 × 10^{5} 2.110  0.839  1.190  0.082  4.222 Muon critical energy
300. GeV 3.001 × 10^{5} 2.136  1.153  1.639  0.109  5.038  9.640 × 10^{4}
400. GeV 4.001 × 10^{5} 2.162  1.585  2.258  0.145  6.151  1.143 × 10^{5}
800. GeV 8.001 × 10^{5} 2.224  3.370  4.799  0.293  10.687  1.631 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.244  4.287  6.099  0.369  13.000  1.800 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.275  6.127  8.692  0.522  17.618  2.064 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.308  8.941  12.651  0.755  24.657  2.350 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.346  13.642  19.231  1.155  36.375  2.682 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.374  18.406  25.880  1.561  48.222  2.920 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.441  37.618  52.615  3.245  95.921  3.497 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.463  47.302  66.055  4.110 119.932  3.683 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.497  66.618  92.871  5.885 167.873  3.964 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.534  95.768 133.268  8.606 240.177  4.261 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.576 144.295 200.482  13.309 360.663  4.599 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.606 193.001 267.858  18.123 481.589  4.838 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.682 388.132 537.566  38.226 966.607  5.412 × 10^{5}
100. TeV 1.000 × 10^{8} 2.706 485.870 672.550  48.610 1209.737  5.597 × 10^{5}