Muons in rubidium (Rb)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
37 (Rb) 85.4678(3)  1.532  363.0 0.07261 3.4177 0.5737 3.7995 6.4776  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.920  4.920  1.150 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.880  3.880  2.075 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.061  3.061  3.835 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.398  2.398  7.575 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.061  2.061  1.210 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.569  1.569  3.502 × 10^{1}
100. MeV 1.764 × 10^{2} 1.482  1.483  4.817 × 10^{1}
140. MeV 2.218 × 10^{2} 1.399  1.399  7.606 × 10^{1}
200. MeV 2.868 × 10^{2} 1.361  1.361  1.197 × 10^{2}
239. MeV 3.285 × 10^{2} 1.356  1.356 Minimum ionization
300. MeV 3.917 × 10^{2} 1.362  0.000  0.000  1.362  1.933 × 10^{2}
400. MeV 4.945 × 10^{2} 1.385  0.000  0.000  1.385  2.661 × 10^{2}
800. MeV 8.995 × 10^{2} 1.480  0.001  0.000  1.481  5.449 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.517  0.001  0.000  1.519  6.782 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.576  0.001  0.000  0.001  1.578  9.363 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.639  0.002  0.001  0.001  1.643  1.308 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.709  0.004  0.003  0.001  1.717  1.903 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.757  0.005  0.004  0.002  1.769  2.476 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.865  0.013  0.013  0.003  1.896  4.652 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.898  0.018  0.019  0.004  1.938  5.695 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.944  0.027  0.030  0.006  2.007  7.721 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.990  0.042  0.049  0.008  2.089  1.065 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.038  0.069  0.085  0.012  2.204  1.531 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.070  0.097  0.124  0.015  2.307  1.974 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.141  0.219  0.298  0.030  2.688  3.577 × 10^{4}
100. GeV 1.001 × 10^{5} 2.163  0.283  0.391  0.037  2.875  4.296 × 10^{4}
140. GeV 1.401 × 10^{5} 2.194  0.416  0.584  0.052  3.247  5.605 × 10^{4}
200. GeV 2.001 × 10^{5} 2.227  0.623  0.889  0.074  3.814  7.308 × 10^{4}
275. GeV 2.746 × 10^{5} 2.255  0.886  1.268  0.101  4.512 Muon critical energy
300. GeV 3.001 × 10^{5} 2.263  0.978  1.400  0.110  4.753  9.653 × 10^{4}
400. GeV 4.001 × 10^{5} 2.289  1.345  1.930  0.147  5.712  1.157 × 10^{5}
800. GeV 8.001 × 10^{5} 2.351  2.862  4.104  0.297  9.615  1.691 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.371  3.642  5.216  0.374  11.604  1.880 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.402  5.206  7.437  0.529  15.574  2.177 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.435  7.599  10.826  0.766  21.627  2.502 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.473  11.598  16.460  1.171  31.702  2.882 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.500  15.651  22.155  1.583  41.890  3.156 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.567  32.004  45.053  3.291  82.917  3.822 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.589  40.248  56.566  4.169 103.573  4.037 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.623  56.692  79.535  5.971 144.822  4.362 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.659  81.512 114.140  8.734 207.046  4.707 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.701 122.831 171.718  13.510 310.761  5.098 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.731 164.307 229.439  18.400 414.878  5.376 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.806 330.487 460.492  38.827 832.613  6.043 × 10^{5}
100. TeV 1.000 × 10^{8} 2.831 413.730 576.130  49.380 1042.072  6.257 × 10^{5}