Muons in rhodium (Rh)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
45 (Rh) 102.90550(2) 12.410  449.0 0.19205 2.8633 0.0576 3.1069 4.8008  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.778  4.778  1.190 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.775  3.775  2.141 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.982  2.982  3.949 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.338  2.338  7.787 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.008  2.008  1.243 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.527  1.527  3.598 × 10^{1}
100. MeV 1.764 × 10^{2} 1.442  1.442  4.949 × 10^{1}
140. MeV 2.218 × 10^{2} 1.358  1.358  7.820 × 10^{1}
200. MeV 2.868 × 10^{2} 1.317  1.317  1.232 × 10^{2}
252. MeV 3.421 × 10^{2} 1.310  1.310 Minimum ionization
300. MeV 3.917 × 10^{2} 1.313  0.000  0.000  1.313  1.995 × 10^{2}
400. MeV 4.945 × 10^{2} 1.330  0.000  0.000  1.331  2.751 × 10^{2}
800. MeV 8.995 × 10^{2} 1.412  0.001  0.000  1.413  5.665 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.445  0.001  0.000  1.447  7.063 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.498  0.002  0.000  0.001  1.501  9.775 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.555  0.003  0.001  0.001  1.560  1.369 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.620  0.004  0.003  0.001  1.629  1.996 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.664  0.007  0.005  0.002  1.678  2.600 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.765  0.016  0.016  0.003  1.801  4.892 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.795  0.021  0.022  0.004  1.843  5.989 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.839  0.033  0.036  0.005  1.913  8.118 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.882  0.051  0.059  0.008  1.999  1.118 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.927  0.083  0.102  0.011  2.124  1.603 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.958  0.117  0.149  0.015  2.239  2.062 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.025  0.264  0.357  0.030  2.677  3.692 × 10^{4}
100. GeV 1.001 × 10^{5} 2.046  0.342  0.469  0.037  2.896  4.410 × 10^{4}
140. GeV 1.401 × 10^{5} 2.077  0.503  0.701  0.051  3.332  5.697 × 10^{4}
200. GeV 2.001 × 10^{5} 2.109  0.754  1.067  0.072  4.003  7.338 × 10^{4}
221. GeV 2.214 × 10^{5} 2.118  0.843  1.195  0.080  4.237 Muon critical energy
300. GeV 3.001 × 10^{5} 2.145  1.182  1.679  0.109  5.116  9.544 × 10^{4}
400. GeV 4.001 × 10^{5} 2.171  1.625  2.313  0.145  6.255  1.131 × 10^{5}
800. GeV 8.001 × 10^{5} 2.234  3.456  4.915  0.293  10.898  1.610 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.254  4.396  6.246  0.368  13.265  1.776 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.285  6.282  8.902  0.521  17.992  2.034 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.318  9.168  12.956  0.754  25.198  2.314 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.356  13.986  19.693  1.153  37.191  2.639 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.384  18.871  26.503  1.559  49.318  2.872 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.452  38.567  53.879  3.240  98.139  3.436 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.474  48.494  67.641  4.103 122.713  3.618 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.508  68.295  95.100  5.875 171.780  3.892 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.545  98.176 136.466  8.592 245.780  4.182 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.587 147.920 205.292  13.288 369.088  4.512 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.618 197.847 274.285  18.095 492.845  4.746 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.693 397.871 550.454  38.165 989.185  5.307 × 10^{5}
100. TeV 1.000 × 10^{8} 2.718 498.060 688.670  48.530 1237.979  5.488 × 10^{5}