Muons in rhenium (Re)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
75 (Re) 186.207(1) 21.020  736.0 0.15184 2.8627 0.0559 3.4845 5.3445  0.08
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.991  3.991  1.450 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.179  3.179  2.584 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.529  2.529  4.722 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.996  1.996  9.229 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.722  1.722  1.466 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.320  1.320  4.197 × 10^{1}
100. MeV 1.764 × 10^{2} 1.248  1.248  5.759 × 10^{1}
140. MeV 2.218 × 10^{2} 1.179  1.179  9.070 × 10^{1}
200. MeV 2.868 × 10^{2} 1.147  1.147  1.425 × 10^{2}
243. MeV 3.325 × 10^{2} 1.143  0.000  1.143 Minimum ionization
300. MeV 3.917 × 10^{2} 1.147  0.000  0.000  1.148  2.298 × 10^{2}
400. MeV 4.945 × 10^{2} 1.166  0.000  0.000  1.166  3.163 × 10^{2}
800. MeV 8.995 × 10^{2} 1.245  0.001  0.000  1.246  6.476 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.277  0.001  0.000  1.279  8.060 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.327  0.002  0.001  1.330  1.112 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.382  0.004  0.001  0.001  1.388  1.554 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.443  0.007  0.003  0.001  1.455  2.256 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.486  0.010  0.006  0.002  1.504  2.932 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.583  0.024  0.021  0.003  1.632  5.475 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.613  0.031  0.030  0.004  1.678  6.683 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.655  0.048  0.049  0.005  1.757  9.010 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.697  0.074  0.080  0.007  1.859  1.233 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.741  0.121  0.141  0.011  2.015  1.749 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.770  0.172  0.208  0.014  2.165  2.227 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.836  0.388  0.502  0.028  2.755  3.861 × 10^{4}
100. GeV 1.001 × 10^{5} 1.856  0.503  0.660  0.035  3.055  4.550 × 10^{4}
140. GeV 1.401 × 10^{5} 1.885  0.738  0.986  0.048  3.659  5.746 × 10^{4}
148. GeV 1.480 × 10^{5} 1.890  0.786  1.053  0.051  3.781 Muon critical energy
200. GeV 2.001 × 10^{5} 1.915  1.106  1.503  0.069  4.594  7.207 × 10^{4}
300. GeV 3.001 × 10^{5} 1.948  1.734  2.366  0.103  6.153  9.083 × 10^{4}
400. GeV 4.001 × 10^{5} 1.972  2.383  3.260  0.138  7.754  1.053 × 10^{5}
800. GeV 8.001 × 10^{5} 2.030  5.059  6.924  0.278  14.293  1.427 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.049  6.434  8.799  0.350  17.632  1.553 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.077  9.187  12.536  0.495  24.297  1.745 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.108  13.397  18.239  0.716  34.462  1.952 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.143  20.421  27.716  1.095  51.377  2.188 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.168  27.537  37.291  1.479  68.478  2.356 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.231  56.214  75.779  3.072 137.297  2.761 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.251  70.659  95.123  3.889 171.924  2.890 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.283  99.471 133.722  5.566 241.043  3.086 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.317 142.932 191.864  8.134 345.248  3.293 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.356 215.283 288.597  12.570 518.807  3.528 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.384 287.882 385.553  17.109 692.930  3.694 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.453 578.670 773.636  36.046 1390.807  4.093 × 10^{5}
100. TeV 1.000 × 10^{8} 2.476 724.290 967.850  45.820 1740.438  4.221 × 10^{5}