Muons in radon (Rn)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
86 (Rn) [222.01758(2)]9.066 × 10^{−3} 794.0 0.20798 2.7409 1.5368 4.9889 13.2839 0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.782  3.782  1.535 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.018  3.018  2.730 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.405  2.405  4.980 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.902  1.902  9.715 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.644  1.644  1.540 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.267  1.267  4.394 × 10^{1}
100. MeV 1.764 × 10^{2} 1.201  1.201  6.019 × 10^{1}
140. MeV 2.218 × 10^{2} 1.140  1.140  9.452 × 10^{1}
200. MeV 2.868 × 10^{2} 1.116  1.117  1.479 × 10^{2}
216. MeV 3.039 × 10^{2} 1.116  1.116 Minimum ionization
300. MeV 3.917 × 10^{2} 1.127  0.000  0.000  1.128  2.372 × 10^{2}
400. MeV 4.945 × 10^{2} 1.154  0.000  0.000  1.154  3.249 × 10^{2}
800. MeV 8.995 × 10^{2} 1.258  0.001  0.000  1.260  6.559 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.300  0.001  0.000  1.302  8.119 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.367  0.002  0.001  1.371  1.111 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.443  0.004  0.001  0.001  1.449  1.536 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.531  0.007  0.003  0.001  1.543  2.204 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.595  0.010  0.006  0.002  1.614  2.837 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.745  0.026  0.022  0.003  1.796  5.173 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.790  0.034  0.031  0.004  1.860  6.267 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.855  0.052  0.051  0.005  1.964  8.357 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.920  0.081  0.085  0.007  2.094  1.131 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.989  0.132  0.149  0.011  2.282  1.588 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.035  0.187  0.221  0.014  2.457  2.010 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.135  0.422  0.535  0.028  3.121  3.450 × 10^{4}
100. GeV 1.001 × 10^{5} 2.165  0.547  0.704  0.034  3.452  4.059 × 10^{4}
140. GeV 1.401 × 10^{5} 2.208  0.804  1.053  0.048  4.114  5.119 × 10^{4}
160. GeV 1.602 × 10^{5} 2.224  0.936  1.235  0.054  4.450 Muon critical energy
200. GeV 2.001 × 10^{5} 2.251  1.204  1.606  0.068  5.131  6.423 × 10^{4}
300. GeV 3.001 × 10^{5} 2.297  1.888  2.530  0.102  6.817  8.110 × 10^{4}
400. GeV 4.001 × 10^{5} 2.328  2.594  3.487  0.136  8.545  9.418 × 10^{4}
800. GeV 8.001 × 10^{5} 2.399  5.506  7.409  0.274  15.590  1.283 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.420  7.001  9.415  0.344  19.183  1.399 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.452  9.996  13.415  0.487  26.353  1.576 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.485  14.573  19.519  0.705  37.285  1.767 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.522  22.211  29.661  1.077  55.473  1.985 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.547  29.946  39.909  1.455  73.860  2.141 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.609  61.114  81.099  3.021 147.844  2.516 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.628  76.812 101.800  3.825 185.067  2.637 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.659 108.123 143.108  5.473 259.364  2.819 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.691 155.348 205.330  7.998 371.369  3.011 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.729 233.967 308.849  12.357 557.903  3.229 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.756 312.850 412.606  16.816 745.030  3.384 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.822 628.791 827.918  35.424 1494.957  3.755 × 10^{5}
100. TeV 1.000 × 10^{8} 2.844 787.000 1035.760  45.030 1870.636  3.875 × 10^{5}