Muons in radium (Ra)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
88 (Ra) [226.02541(2)] 5.000  826.0 0.08804 3.2454 0.5991 3.9428 7.0452  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.765  3.765  1.546 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.007  3.007  2.745 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.398  2.398  5.002 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.898  1.898  9.749 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.641  1.641  1.545 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.264  1.264  4.404 × 10^{1}
100. MeV 1.764 × 10^{2} 1.199  1.199  6.032 × 10^{1}
140. MeV 2.218 × 10^{2} 1.137  1.138  9.472 × 10^{1}
200. MeV 2.868 × 10^{2} 1.112  1.112  1.482 × 10^{2}
222. MeV 3.104 × 10^{2} 1.111  0.000  1.111 Minimum ionization
300. MeV 3.917 × 10^{2} 1.120  0.000  0.000  1.121  2.380 × 10^{2}
400. MeV 4.945 × 10^{2} 1.144  0.000  0.000  1.145  3.263 × 10^{2}
800. MeV 8.995 × 10^{2} 1.236  0.001  0.000  1.238  6.616 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.271  0.002  0.000  1.273  8.209 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.326  0.003  0.001  1.330  1.128 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.385  0.004  0.001  0.001  1.391  1.569 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.451  0.007  0.003  0.001  1.463  2.268 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.497  0.011  0.006  0.002  1.516  2.939 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.599  0.026  0.022  0.003  1.651  5.457 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.629  0.035  0.032  0.004  1.700  6.651 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.673  0.053  0.052  0.005  1.784  8.946 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.716  0.083  0.086  0.007  1.893  1.221 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.761  0.136  0.153  0.011  2.061  1.727 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.792  0.192  0.225  0.014  2.224  2.193 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.858  0.434  0.546  0.027  2.868  3.773 × 10^{4}
100. GeV 1.001 × 10^{5} 1.878  0.562  0.720  0.034  3.196  4.434 × 10^{4}
137. GeV 1.374 × 10^{5} 1.906  0.807  1.052  0.047  3.814 Muon critical energy
140. GeV 1.401 × 10^{5} 1.908  0.825  1.077  0.048  3.859  5.572 × 10^{4}
200. GeV 2.001 × 10^{5} 1.938  1.237  1.643  0.068  4.886  6.951 × 10^{4}
300. GeV 3.001 × 10^{5} 1.971  1.938  2.587  0.101  6.599  8.707 × 10^{4}
400. GeV 4.001 × 10^{5} 1.994  2.663  3.566  0.135  8.360  1.005 × 10^{5}
800. GeV 8.001 × 10^{5} 2.050  5.653  7.579  0.274  15.557  1.351 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.068  7.188  9.631  0.344  19.233  1.466 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.096  10.262  13.723  0.487  26.570  1.642 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.125  14.962  19.968  0.704  37.760  1.831 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.159  22.802  30.342  1.076  56.381  2.046 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.184  30.742  40.826  1.453  75.207  2.199 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.244  62.734  82.963  3.016 150.959  2.567 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.264  78.847 104.140  3.818 189.071  2.685 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.294 110.985 146.397  5.463 265.143  2.863 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.327 159.458 210.050  7.984 379.821  3.051 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.365 240.152 315.949  12.336 570.803  3.265 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.392 321.116 422.091  16.788 762.389  3.416 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.459 645.395 846.939  35.363 1530.158  3.779 × 10^{5}
100. TeV 1.000 × 10^{8} 2.481 807.780 1059.550  44.950 1914.763  3.895 × 10^{5}