Muons in protactinium (Pa)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
91 (Pa) [231.03588(2)] 15.370  878.0 0.14770 2.9845 0.3144 3.5079 6.0327  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.749  3.749  1.558 × 10^{0}
14.0 MeV 5.616 × 10^{1} 2.999  2.999  2.761 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.395  2.395  5.023 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.897  1.897  9.774 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.640  1.640  1.548 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.263  1.263  4.408 × 10^{1}
100. MeV 1.764 × 10^{2} 1.197  1.197  6.038 × 10^{1}
140. MeV 2.218 × 10^{2} 1.134  1.134  9.486 × 10^{1}
200. MeV 2.868 × 10^{2} 1.109  1.109  1.485 × 10^{2}
226. MeV 3.145 × 10^{2} 1.107  0.000  1.108 Minimum ionization
300. MeV 3.917 × 10^{2} 1.115  0.000  0.000  1.116  2.386 × 10^{2}
400. MeV 4.945 × 10^{2} 1.137  0.000  0.000  1.137  3.274 × 10^{2}
800. MeV 8.995 × 10^{2} 1.222  0.001  0.000  1.223  6.659 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.255  0.002  0.000  1.257  8.272 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.307  0.003  0.001  1.310  1.139 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.363  0.004  0.001  0.001  1.369  1.586 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.425  0.008  0.003  0.001  1.438  2.298 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.468  0.011  0.006  0.002  1.488  2.981 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.566  0.027  0.023  0.003  1.620  5.547 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.595  0.036  0.033  0.004  1.669  6.763 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.637  0.056  0.054  0.005  1.753  9.100 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.679  0.086  0.089  0.007  1.862  1.242 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.722  0.142  0.158  0.011  2.034  1.755 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.751  0.200  0.233  0.014  2.200  2.228 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.816  0.453  0.566  0.027  2.864  3.817 × 10^{4}
100. GeV 1.001 × 10^{5} 1.835  0.587  0.746  0.034  3.204  4.477 × 10^{4}
130. GeV 1.301 × 10^{5} 1.857  0.792  1.022  0.044  3.716 Muon critical energy
140. GeV 1.401 × 10^{5} 1.864  0.861  1.117  0.047  3.891  5.609 × 10^{4}
200. GeV 2.001 × 10^{5} 1.893  1.291  1.704  0.068  4.957  6.973 × 10^{4}
300. GeV 3.001 × 10^{5} 1.926  2.023  2.684  0.101  6.736  8.698 × 10^{4}
400. GeV 4.001 × 10^{5} 1.949  2.780  3.700  0.135  8.566  1.001 × 10^{5}
800. GeV 8.001 × 10^{5} 2.005  5.901  7.864  0.273  16.045  1.337 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.024  7.502  9.994  0.343  19.865  1.449 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.051  10.710  14.241  0.486  27.491  1.620 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.081  15.614  20.722  0.702  39.121  1.802 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.116  23.794  31.489  1.073  58.474  2.009 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.141  32.078  42.369  1.450  78.040  2.157 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.202  65.456  86.099  3.010 156.768  2.511 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.222  82.266 108.077  3.810 196.377  2.625 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.253 115.794 151.933  5.452 275.434  2.796 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.286 166.362 217.994  7.966 394.610  2.977 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.324 250.545 327.892  12.307 593.071  3.183 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.351 335.009 438.043  16.749 792.154  3.328 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.419 673.294 878.959  35.283 1589.958  3.677 × 10^{5}
100. TeV 1.000 × 10^{8} 2.442 842.690 1099.620  44.850 1989.604  3.790 × 10^{5}