Muons in promethium (Pm)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
61 (Pm) [144.91275(3)] 7.264  560.0 0.24280 2.6674 0.1614 3.3186 5.8163  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.418  4.418  1.295 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.501  3.501  2.322 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.773  2.773  4.268 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.180  2.180  8.388 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.877  1.877  1.336 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.431  1.431  3.850 × 10^{1}
100. MeV 1.764 × 10^{2} 1.354  1.354  5.291 × 10^{1}
140. MeV 2.218 × 10^{2} 1.279  1.279  8.344 × 10^{1}
200. MeV 2.868 × 10^{2} 1.244  1.244  1.312 × 10^{2}
243. MeV 3.325 × 10^{2} 1.240  0.000  1.240 Minimum ionization
300. MeV 3.917 × 10^{2} 1.245  0.000  0.000  1.246  2.117 × 10^{2}
400. MeV 4.945 × 10^{2} 1.265  0.000  0.000  1.266  2.914 × 10^{2}
800. MeV 8.995 × 10^{2} 1.351  0.001  0.000  1.353  5.967 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.386  0.001  0.000  1.388  7.426 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.440  0.002  0.000  0.001  1.443  1.025 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.500  0.003  0.001  0.001  1.505  1.432 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.567  0.006  0.003  0.001  1.577  2.080 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.613  0.008  0.006  0.002  1.629  2.703 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.717  0.020  0.019  0.003  1.760  5.056 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.749  0.027  0.027  0.004  1.807  6.177 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.794  0.041  0.043  0.005  1.884  8.344 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.838  0.063  0.071  0.007  1.981  1.145 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.885  0.104  0.124  0.011  2.125  1.632 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.916  0.146  0.182  0.015  2.261  2.088 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.985  0.331  0.438  0.029  2.784  3.679 × 10^{4}
100. GeV 1.001 × 10^{5} 2.006  0.429  0.576  0.036  3.048  4.365 × 10^{4}
140. GeV 1.401 × 10^{5} 2.036  0.629  0.861  0.049  3.577  5.576 × 10^{4}
180. GeV 1.801 × 10^{5} 2.058  0.837  1.158  0.063  4.117 Muon critical energy
200. GeV 2.001 × 10^{5} 2.067  0.943  1.310  0.070  4.392  7.088 × 10^{4}
300. GeV 3.001 × 10^{5} 2.102  1.479  2.062  0.105  5.750  9.073 × 10^{4}
400. GeV 4.001 × 10^{5} 2.127  2.033  2.841  0.141  7.143  1.063 × 10^{5}
800. GeV 8.001 × 10^{5} 2.187  4.320  6.033  0.284  12.826  1.475 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.207  5.494  7.666  0.357  15.726  1.616 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.237  7.848  10.923  0.506  21.515  1.833 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.268  11.447  15.893  0.732  30.342  2.066 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.305  17.455  24.152  1.119  45.032  2.335 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.332  23.542  32.498  1.511  59.884  2.527 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.397  48.079  66.045  3.139 119.662  2.991 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.419  60.442  82.907  3.975 149.744  3.140 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.451  85.101 116.552  5.690 209.797  3.364 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.487 122.304 167.234  8.318 300.344  3.602 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.528 184.238 251.560  12.857 451.184  3.872 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.557 246.390 336.084  17.501 602.534  4.063 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.630 495.360 674.412  36.889 1209.293  4.522 × 10^{5}
100. TeV 1.000 × 10^{8} 2.653 620.050 843.730  46.900 1513.335  4.670 × 10^{5}