Muons in praseodymium (Pr)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
59 (Pr) 140.90766(2) 6.773  535.0 0.23265 2.7331 0.2313 3.2753 5.8003  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.435  4.435  1.288 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.513  3.513  2.311 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.781  2.781  4.251 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.186  2.186  8.360 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.882  1.882  1.332 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.436  1.436  3.839 × 10^{1}
100. MeV 1.764 × 10^{2} 1.356  1.356  5.275 × 10^{1}
140. MeV 2.218 × 10^{2} 1.282  1.282  8.322 × 10^{1}
200. MeV 2.868 × 10^{2} 1.247  1.248  1.308 × 10^{2}
239. MeV 3.285 × 10^{2} 1.243  0.000  1.244 Minimum ionization
300. MeV 3.917 × 10^{2} 1.249  0.000  0.000  1.249  2.111 × 10^{2}
400. MeV 4.945 × 10^{2} 1.268  0.000  0.000  1.269  2.906 × 10^{2}
800. MeV 8.995 × 10^{2} 1.355  0.001  0.000  1.356  5.951 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.389  0.001  0.000  1.391  7.407 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.443  0.002  0.000  0.001  1.446  1.022 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.502  0.003  0.001  0.001  1.508  1.428 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.568  0.005  0.003  0.001  1.579  2.075 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.614  0.008  0.006  0.002  1.630  2.698 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.717  0.020  0.019  0.003  1.759  5.051 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.748  0.026  0.026  0.004  1.805  6.173 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.792  0.040  0.043  0.005  1.881  8.343 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.836  0.062  0.070  0.007  1.976  1.145 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.882  0.102  0.122  0.011  2.118  1.634 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.913  0.143  0.179  0.015  2.251  2.092 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.980  0.324  0.430  0.029  2.764  3.692 × 10^{4}
100. GeV 1.001 × 10^{5} 2.000  0.420  0.566  0.036  3.023  4.384 × 10^{4}
140. GeV 1.401 × 10^{5} 2.030  0.616  0.845  0.050  3.542  5.605 × 10^{4}
183. GeV 1.827 × 10^{5} 2.053  0.833  1.156  0.065  4.108 Muon critical energy
200. GeV 2.001 × 10^{5} 2.061  0.924  1.286  0.071  4.343  7.133 × 10^{4}
300. GeV 3.001 × 10^{5} 2.096  1.448  2.024  0.106  5.675  9.143 × 10^{4}
400. GeV 4.001 × 10^{5} 2.120  1.991  2.788  0.141  7.042  1.072 × 10^{5}
800. GeV 8.001 × 10^{5} 2.180  4.229  5.922  0.285  12.618  1.491 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.200  5.379  7.525  0.359  15.464  1.634 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.229  7.684  10.722  0.508  21.145  1.854 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.261  11.209  15.600  0.734  29.806  2.092 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.298  17.093  23.707  1.123  44.222  2.366 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.324  23.055  31.899  1.517  58.797  2.562 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.389  47.088  64.830  3.151 117.460  3.033 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.411  59.197  81.383  3.990 146.982  3.185 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.443  83.351 114.411  5.712 205.918  3.414 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.478 119.792 164.162  8.350 294.784  3.656 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.519 180.457 246.940  12.907 442.825  3.931 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.548 241.336 329.913  17.571 591.370  4.126 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.621 485.210 662.036  37.038 1186.907  4.594 × 10^{5}
100. TeV 1.000 × 10^{8} 2.644 607.350 828.250  47.090 1485.336  4.744 × 10^{5}