Muons in potassium (K)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
19 (K) 39.0983(1)  0.862  190.0 0.19827 2.9233 0.3851 3.1724 5.6423  0.10
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.123  6.123  9.134 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.803  4.803  1.659 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.770  3.770  3.084 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.939  2.939  6.130 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.518  2.518  9.829 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.903  1.903  2.867 × 10^{1}
100. MeV 1.764 × 10^{2} 1.794  1.794  3.952 × 10^{1}
140. MeV 2.218 × 10^{2} 1.687  1.687  6.262 × 10^{1}
200. MeV 2.868 × 10^{2} 1.633  1.633  9.891 × 10^{1}
260. MeV 3.496 × 10^{2} 1.623  0.000  1.623 Minimum ionization
300. MeV 3.917 × 10^{2} 1.625  0.000  1.625  1.604 × 10^{2}
400. MeV 4.945 × 10^{2} 1.644  0.000  0.000  1.645  2.216 × 10^{2}
800. MeV 8.995 × 10^{2} 1.739  0.000  0.000  1.740  4.579 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.778  0.001  0.000  1.779  5.716 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.839  0.001  0.000  0.001  1.841  7.925 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.905  0.001  0.001  0.001  1.909  1.112 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.980  0.002  0.002  0.001  1.986  1.625 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.032  0.003  0.003  0.002  2.040  2.122 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.147  0.008  0.008  0.004  2.167  4.017 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.182  0.011  0.011  0.004  2.209  4.931 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.231  0.017  0.018  0.006  2.272  6.715 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.280  0.026  0.030  0.008  2.345  9.313 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.331  0.042  0.052  0.012  2.439  1.349 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.366  0.059  0.076  0.016  2.518  1.753 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.442  0.134  0.183  0.032  2.791  3.259 × 10^{4}
100. GeV 1.001 × 10^{5} 2.465  0.174  0.241  0.039  2.920  3.959 × 10^{4}
140. GeV 1.401 × 10^{5} 2.499  0.256  0.360  0.055  3.170  5.273 × 10^{4}
200. GeV 2.001 × 10^{5} 2.535  0.384  0.549  0.078  3.546  7.062 × 10^{4}
300. GeV 3.001 × 10^{5} 2.575  0.604  0.867  0.117  4.163  9.662 × 10^{4}
400. GeV 4.001 × 10^{5} 2.604  0.831  1.197  0.156  4.788  1.190 × 10^{5}
472. GeV 4.718 × 10^{5} 2.620  0.997  1.439  0.184  5.241 Muon critical energy
800. GeV 8.001 × 10^{5} 2.673  1.771  2.555  0.315  7.315  1.861 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.696  2.256  3.251  0.396  8.599  2.113 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.730  3.228  4.641  0.561  11.162  2.520 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.767  4.719  6.767  0.812  15.065  2.982 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.810  7.211  10.299  1.243  21.563  3.534 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.840  9.740  13.874  1.680  28.135  3.938 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.916  19.954  28.253  3.499  54.622  4.941 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.941  25.108  35.486  4.434  67.969  5.268 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.978  35.398  49.914  6.356  94.647  5.765 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.019  50.942  71.658  9.306 134.926  6.293 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.066  76.787 107.836  14.414 202.105  6.895 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.100 102.737 144.112  19.650 269.600  7.322 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.184 206.767 289.333  41.557 540.842  8.349 × 10^{5}
100. TeV 1.000 × 10^{8} 3.212 258.900 362.020  52.890 677.022  8.678 × 10^{5}