Muons in polystyrene [(C_6H_5CHCH_2)_n]

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.53768 1.060 68.7 0.16454 3.2224 0.1647 2.5031 3.2999 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.803 7.803 7.077 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.084 6.084 1.294 × 10^0 20.0 MeV 6.802 × 10^1 4.749 4.749 2.424 × 10^0 30.0 MeV 8.509 × 10^1 3.683 3.683 4.848 × 10^0 40.0 MeV 1.003 × 10^2 3.144 3.144 7.806 × 10^0 80.0 MeV 1.527 × 10^2 2.359 2.359 2.296 × 10^1 100. MeV 1.764 × 10^2 2.210 2.211 3.174 × 10^1 140. MeV 2.218 × 10^2 2.058 2.058 5.059 × 10^1 200. MeV 2.868 × 10^2 1.970 1.971 8.049 × 10^1 300. MeV 3.917 × 10^2 1.937 0.000 1.937 1.318 × 10^2 318. MeV 4.105 × 10^2 1.936 0.000 1.936 Minimum ionization 400. MeV 4.945 × 10^2 1.942 0.000 1.943 1.834 × 10^2 800. MeV 8.995 × 10^2 2.015 0.000 0.000 2.015 3.856 × 10^2 1.00 GeV 1.101 × 10^3 2.048 0.000 0.000 2.049 4.841 × 10^2 1.40 GeV 1.502 × 10^3 2.102 0.000 0.001 2.103 6.767 × 10^2 2.00 GeV 2.103 × 10^3 2.161 0.000 0.000 0.001 2.163 9.578 × 10^2 3.00 GeV 3.104 × 10^3 2.228 0.001 0.001 0.001 2.231 1.413 × 10^3 4.00 GeV 4.104 × 10^3 2.275 0.001 0.001 0.002 2.279 1.856 × 10^3 8.00 GeV 8.105 × 10^3 2.382 0.003 0.003 0.004 2.391 3.564 × 10^3 10.0 GeV 1.011 × 10^4 2.414 0.004 0.004 0.005 2.427 4.394 × 10^3 14.0 GeV 1.411 × 10^4 2.461 0.006 0.006 0.007 2.480 6.023 × 10^3 20.0 GeV 2.011 × 10^4 2.509 0.009 0.010 0.009 2.538 8.413 × 10^3 30.0 GeV 3.011 × 10^4 2.560 0.015 0.018 0.014 2.607 1.230 × 10^4 40.0 GeV 4.011 × 10^4 2.596 0.021 0.027 0.018 2.662 1.609 × 10^4 80.0 GeV 8.011 × 10^4 2.677 0.049 0.065 0.035 2.825 3.065 × 10^4 100. GeV 1.001 × 10^5 2.702 0.063 0.086 0.043 2.895 3.765 × 10^4 140. GeV 1.401 × 10^5 2.740 0.093 0.130 0.059 3.022 5.116 × 10^4 200. GeV 2.001 × 10^5 2.779 0.141 0.199 0.084 3.203 7.044 × 10^4 300. GeV 3.001 × 10^5 2.824 0.222 0.316 0.126 3.489 1.003 × 10^5 400. GeV 4.001 × 10^5 2.855 0.307 0.439 0.168 3.770 1.279 × 10^5 800. GeV 8.001 × 10^5 2.932 0.661 0.951 0.340 4.884 2.208 × 10^5 1.00 TeV 1.000 × 10^6 2.957 0.844 1.216 0.428 5.445 2.596 × 10^5 1.18 TeV 1.183 × 10^6 2.976 1.011 1.456 0.509 5.953 Muon critical energy 1.40 TeV 1.400 × 10^6 2.995 1.212 1.743 0.606 6.558 3.265 × 10^5 2.00 TeV 2.000 × 10^6 3.036 1.779 2.552 0.878 8.246 4.079 × 10^5 3.00 TeV 3.000 × 10^6 3.083 2.730 3.899 1.346 11.059 5.123 × 10^5 4.00 TeV 4.000 × 10^6 3.117 3.698 5.266 1.822 13.903 5.928 × 10^5 8.00 TeV 8.000 × 10^6 3.201 7.621 10.772 3.804 25.399 8.025 × 10^5 10.0 TeV 1.000 × 10^7 3.228 9.606 13.547 4.825 31.207 8.734 × 10^5 14.0 TeV 1.400 × 10^7 3.270 13.568 19.074 6.931 42.843 9.824 × 10^5 20.0 TeV 2.000 × 10^7 3.315 19.563 27.412 10.166 60.456 1.100 × 10^6 30.0 TeV 3.000 × 10^7 3.367 29.546 41.284 15.784 89.982 1.234 × 10^6 40.0 TeV 4.000 × 10^7 3.405 39.586 55.203 21.551 119.744 1.331 × 10^6 80.0 TeV 8.000 × 10^7 3.498 79.826 110.926 45.767 240.016 1.562 × 10^6 100. TeV 1.000 × 10^8 3.528 99.994 138.821 58.325 300.668 1.636 × 10^6