Muons in polonium (Po)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
84 (Po) [208.98243(2)] 9.320  830.0 0.09282 3.1830 0.4267 3.8293 6.4003  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.877  3.877  1.503 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.098  3.098  2.667 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.471  2.471  4.858 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.956  1.956  9.464 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.691  1.691  1.500 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.302  1.302  4.275 × 10^{1}
100. MeV 1.764 × 10^{2} 1.234  1.234  5.856 × 10^{1}
140. MeV 2.218 × 10^{2} 1.170  1.170  9.199 × 10^{1}
200. MeV 2.868 × 10^{2} 1.142  1.142  1.441 × 10^{2}
222. MeV 3.104 × 10^{2} 1.141  0.000  1.141 Minimum ionization
300. MeV 3.917 × 10^{2} 1.150  0.000  0.000  1.150  2.315 × 10^{2}
400. MeV 4.945 × 10^{2} 1.172  0.000  0.000  1.173  3.176 × 10^{2}
800. MeV 8.995 × 10^{2} 1.261  0.001  0.000  1.262  6.458 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.295  0.002  0.000  1.297  8.020 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.349  0.002  0.001  1.352  1.104 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.407  0.004  0.001  0.001  1.413  1.537 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.472  0.007  0.003  0.001  1.485  2.226 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.517  0.011  0.007  0.002  1.536  2.888 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.619  0.026  0.023  0.003  1.671  5.374 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.649  0.035  0.032  0.004  1.720  6.553 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.693  0.053  0.052  0.005  1.804  8.822 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.736  0.082  0.087  0.007  1.913  1.205 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.782  0.135  0.153  0.011  2.081  1.706 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.813  0.190  0.225  0.014  2.243  2.168 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.880  0.430  0.545  0.028  2.884  3.737 × 10^{4}
100. GeV 1.001 × 10^{5} 1.900  0.557  0.718  0.034  3.211  4.394 × 10^{4}
139. GeV 1.395 × 10^{5} 1.930  0.814  1.068  0.048  3.861 Muon critical energy
140. GeV 1.401 × 10^{5} 1.930  0.817  1.074  0.048  3.870  5.528 × 10^{4}
200. GeV 2.001 × 10^{5} 1.960  1.225  1.637  0.068  4.892  6.904 × 10^{4}
300. GeV 3.001 × 10^{5} 1.994  1.920  2.578  0.102  6.597  8.659 × 10^{4}
400. GeV 4.001 × 10^{5} 2.018  2.638  3.553  0.136  8.348  1.000 × 10^{5}
800. GeV 8.001 × 10^{5} 2.076  5.601  7.550  0.276  15.504  1.347 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.095  7.121  9.595  0.346  19.158  1.463 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.123  10.167  13.671  0.490  26.453  1.640 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.154  14.823  19.891  0.709  37.579  1.829 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.189  22.592  30.225  1.084  56.091  2.046 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.214  30.460  40.669  1.464  74.808  2.199 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.277  62.164  82.641  3.039 150.123  2.569 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.297  78.133 103.736  3.847 188.015  2.688 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.328 109.983 145.829  5.505 263.647  2.867 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.362 158.022 209.234  8.044 377.664  3.056 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.401 237.997 314.721  12.430 567.550  3.271 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.429 318.241 420.450  16.917 758.039  3.423 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.498 639.637 843.657  35.637 1521.432  3.788 × 10^{5}
100. TeV 1.000 × 10^{8} 2.521 800.580 1055.450  45.300 1903.853  3.905 × 10^{5}