Muons in plutonium (Pu)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
94 (Pu) [244.06420(4)] 19.840  921.0 0.20419 2.7679 0.1557 3.3981 5.8748  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.619  3.619  1.619 × 10^{0}
14.0 MeV 5.616 × 10^{1} 2.898  2.898  2.865 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.316  2.316  5.204 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.835  1.835  1.011 × 10^{1}
40.0 MeV 1.003 × 10^{2} 1.587  1.587  1.601 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.220  1.221  4.559 × 10^{1}
100. MeV 1.764 × 10^{2} 1.158  1.158  6.246 × 10^{1}
140. MeV 2.218 × 10^{2} 1.098  1.099  9.808 × 10^{1}
200. MeV 2.868 × 10^{2} 1.073  1.073  1.535 × 10^{2}
227. MeV 3.154 × 10^{2} 1.071  0.000  1.071 Minimum ionization
300. MeV 3.917 × 10^{2} 1.078  0.000  0.000  1.078  2.467 × 10^{2}
400. MeV 4.945 × 10^{2} 1.098  0.000  0.000  1.099  3.386 × 10^{2}
800. MeV 8.995 × 10^{2} 1.180  0.001  0.000  1.181  6.891 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.211  0.002  0.000  1.214  8.561 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.262  0.003  0.001  1.265  1.179 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.316  0.004  0.001  0.001  1.322  1.642 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.377  0.008  0.003  0.001  1.390  2.378 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.420  0.011  0.006  0.002  1.439  3.085 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.515  0.028  0.023  0.003  1.569  5.736 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.544  0.037  0.033  0.004  1.618  6.990 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.585  0.056  0.054  0.005  1.701  9.400 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.626  0.087  0.089  0.007  1.810  1.282 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.669  0.143  0.158  0.011  1.981  1.809 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.698  0.202  0.233  0.014  2.147  2.294 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.761  0.456  0.567  0.027  2.812  3.918 × 10^{4}
100. GeV 1.001 × 10^{5} 1.780  0.591  0.747  0.034  3.153  4.589 × 10^{4}
126. GeV 1.262 × 10^{5} 1.799  0.770  0.987  0.043  3.599 Muon critical energy
140. GeV 1.401 × 10^{5} 1.807  0.867  1.118  0.047  3.841  5.737 × 10^{4}
200. GeV 2.001 × 10^{5} 1.836  1.299  1.707  0.067  4.910  7.116 × 10^{4}
300. GeV 3.001 × 10^{5} 1.868  2.036  2.688  0.101  6.695  8.855 × 10^{4}
400. GeV 4.001 × 10^{5} 1.891  2.798  3.706  0.134  8.531  1.018 × 10^{5}
800. GeV 8.001 × 10^{5} 1.946  5.938  7.879  0.272  16.037  1.354 × 10^{5}
1.00 TeV 1.000 × 10^{6} 1.964  7.550  10.014  0.341  19.871  1.466 × 10^{5}
1.40 TeV 1.400 × 10^{6} 1.991  10.778  14.270  0.483  27.524  1.636 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.020  15.712  20.764  0.699  39.196  1.818 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.054  23.943  31.553  1.068  58.619  2.026 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.078  32.278  42.456  1.442  78.257  2.173 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.138  65.860  86.276  2.994 157.270  2.526 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.158  82.773 108.300  3.790 197.023  2.640 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.188 116.505 152.247  5.423 276.365  2.810 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.220 167.380 218.444  7.924 395.970  2.991 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.257 252.157 328.571  12.242 595.230  3.195 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.284 337.238 438.952  16.659 795.135  3.340 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.351 677.542 880.778  35.088 1595.760  3.688 × 10^{5}
100. TeV 1.000 × 10^{8} 2.372 847.800 1101.890  44.600 1996.664  3.800 × 10^{5}