Muons in platinum (Pt)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
78 (Pt) 195.084(9) 21.450  790.0 0.11128 3.0417 0.1484 3.6212 5.4732  0.12
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.896  3.896  1.492 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.109  3.109  2.651 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.477  2.477  4.836 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.958  1.958  9.435 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.690  1.690  1.496 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.297  1.297  4.278 × 10^{1}
100. MeV 1.764 × 10^{2} 1.228  1.228  5.866 × 10^{1}
140. MeV 2.218 × 10^{2} 1.162  1.162  9.229 × 10^{1}
200. MeV 2.868 × 10^{2} 1.132  1.132  1.448 × 10^{2}
237. MeV 3.260 × 10^{2} 1.128  0.000  1.129 Minimum ionization
300. MeV 3.917 × 10^{2} 1.134  0.000  0.000  1.134  2.332 × 10^{2}
400. MeV 4.945 × 10^{2} 1.153  0.000  0.000  1.153  3.207 × 10^{2}
800. MeV 8.995 × 10^{2} 1.233  0.001  0.000  1.234  6.555 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.265  0.001  0.000  1.267  8.154 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.315  0.002  0.001  1.318  1.125 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.370  0.004  0.001  0.001  1.376  1.570 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.431  0.007  0.003  0.001  1.443  2.278 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.474  0.010  0.006  0.002  1.492  2.959 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.570  0.024  0.022  0.003  1.620  5.523 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.599  0.032  0.031  0.004  1.666  6.740 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.641  0.049  0.050  0.005  1.746  9.083 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.683  0.076  0.082  0.007  1.849  1.242 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.727  0.125  0.144  0.011  2.007  1.761 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.756  0.177  0.212  0.014  2.160  2.241 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.821  0.399  0.513  0.028  2.763  3.874 × 10^{4}
100. GeV 1.001 × 10^{5} 1.841  0.517  0.675  0.035  3.070  4.561 × 10^{4}
140. GeV 1.401 × 10^{5} 1.870  0.759  1.009  0.048  3.688  5.748 × 10^{4}
144. GeV 1.438 × 10^{5} 1.872  0.782  1.041  0.049  3.746 Muon critical energy
200. GeV 2.001 × 10^{5} 1.900  1.138  1.538  0.069  4.646  7.196 × 10^{4}
300. GeV 3.001 × 10^{5} 1.933  1.784  2.422  0.103  6.243  9.047 × 10^{4}
400. GeV 4.001 × 10^{5} 1.957  2.451  3.337  0.137  7.884  1.047 × 10^{5}
800. GeV 8.001 × 10^{5} 2.014  5.204  7.090  0.277  14.587  1.414 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.033  6.618  9.009  0.348  18.009  1.538 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.061  9.449  12.836  0.493  24.841  1.726 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.091  13.779  18.675  0.713  35.261  1.928 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.126  21.002  28.378  1.090  52.599  2.159 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.152  28.319  38.183  1.473  70.128  2.323 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.214  57.805  77.589  3.058 140.669  2.717 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.234  72.658  97.395  3.872 176.161  2.844 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.265 102.282 136.916  5.541 247.006  3.035 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.299 146.966 196.448  8.098 353.813  3.237 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.338 221.354 295.488  12.513 531.696  3.466 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.365 295.996 394.757  17.031 710.151  3.628 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.434 594.964 792.106  35.880 1425.386  4.018 × 10^{5}
100. TeV 1.000 × 10^{8} 2.457 744.680 990.960  45.610 1783.709  4.143 × 10^{5}