Muons in plate glass

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.49731 & 2.400 & 145.4 & 0.07678 & 3.5381 & 0.1237 & 3.0649 & 4.0602 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.525  6.525  8.528 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.107  5.107  1.553 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.002  4.002  2.895 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.115  3.115  5.766 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.666  2.666  9.258 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.011  2.011  2.707 × 10^{1}
100. MeV 1.764 × 10^{2} 1.890  1.890  3.736 × 10^{1}
140. MeV 2.218 × 10^{2} 1.769  1.769  5.933 × 10^{1}
200. MeV 2.868 × 10^{2} 1.703  1.703  9.402 × 10^{1}
288. MeV 3.788 × 10^{2} 1.684  0.000  1.684 Minimum ionization
300. MeV 3.917 × 10^{2} 1.684  0.000  1.684  1.532 × 10^{2}
400. MeV 4.945 × 10^{2} 1.695  0.000  1.696  2.125 × 10^{2}
800. MeV 8.995 × 10^{2} 1.774  0.000  0.000  1.775  4.430 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.808  0.000  0.000  1.809  5.546 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.862  0.001  0.000  0.001  1.863  7.723 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.921  0.001  0.000  0.001  1.923  1.089 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.988  0.002  0.001  0.001  1.992  1.599 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.034  0.002  0.002  0.002  2.040  2.095 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.139  0.005  0.005  0.004  2.153  3.997 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.170  0.007  0.007  0.005  2.189  4.918 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.216  0.011  0.012  0.006  2.245  6.721 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.262  0.017  0.019  0.009  2.307  9.356 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.311  0.028  0.034  0.013  2.385  1.362 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.344  0.039  0.050  0.017  2.450  1.775 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.419  0.088  0.119  0.033  2.660  3.339 × 10^{4}
100. GeV 1.001 × 10^{5} 2.443  0.114  0.157  0.041  2.756  4.078 × 10^{4}
140. GeV 1.401 × 10^{5} 2.477  0.168  0.235  0.057  2.939  5.483 × 10^{4}
200. GeV 2.001 × 10^{5} 2.514  0.253  0.359  0.081  3.207  7.437 × 10^{4}
300. GeV 3.001 × 10^{5} 2.555  0.398  0.569  0.121  3.644  1.036 × 10^{5}
400. GeV 4.001 × 10^{5} 2.585  0.549  0.788  0.161  4.083  1.295 × 10^{5}
671. GeV 6.712 × 10^{5} 2.638  0.969  1.396  0.273  5.276 Muon critical energy
800. GeV 8.001 × 10^{5} 2.656  1.173  1.691  0.326  5.846  2.110 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.679  1.495  2.155  0.410  6.739  2.428 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.714  2.142  3.081  0.581  8.518  2.955 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.752  3.134  4.497  0.842  11.225  3.567 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.795  4.795  6.852  1.289  15.733  4.316 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.827  6.482  9.238  1.744  20.291  4.874 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.904  13.302  18.839  3.636  38.682  6.278 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.929  16.746  23.671  4.610  47.957  6.741 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.968  23.621  33.304  6.614  66.507  7.447 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.010  34.012  47.825  9.691  94.539  8.200 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.058  51.296  71.993  15.025 141.373  9.059 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.093  68.658  96.232  20.495 188.479  9.670 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.179 138.275 193.265  43.419 378.138  1.114 × 10^{6}
100. TeV 1.000 × 10^{8} 3.207 173.170 241.835  55.289 473.501  1.161 × 10^{6}