Muons in phosphorus (P)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
15 (P) 30.973761998(5) 2.200  173.0 0.23610 2.9158 0.1696 2.7815 4.5214  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.182  6.182  9.035 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.845  4.845  1.642 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.800  3.800  3.056 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.959  2.959  6.079 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.532  2.532  9.756 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.907  1.907  2.853 × 10^{1}
100. MeV 1.764 × 10^{2} 1.795  1.795  3.937 × 10^{1}
140. MeV 2.218 × 10^{2} 1.685  1.685  6.247 × 10^{1}
200. MeV 2.868 × 10^{2} 1.627  1.627  9.885 × 10^{1}
273. MeV 3.633 × 10^{2} 1.613  0.000  1.613 Minimum ionization
300. MeV 3.917 × 10^{2} 1.614  0.000  1.614  1.607 × 10^{2}
400. MeV 4.945 × 10^{2} 1.629  0.000  1.629  2.224 × 10^{2}
800. MeV 8.995 × 10^{2} 1.714  0.000  0.000  1.714  4.617 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.749  0.000  0.000  1.750  5.771 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.805  0.001  0.000  0.001  1.807  8.018 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.867  0.001  0.001  0.001  1.869  1.128 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.935  0.002  0.001  0.001  1.940  1.652 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.982  0.003  0.002  0.002  1.989  2.161 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.089  0.007  0.006  0.004  2.105  4.109 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.120  0.009  0.009  0.005  2.143  5.050 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.166  0.013  0.015  0.006  2.200  6.891 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.211  0.021  0.024  0.009  2.265  9.577 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.259  0.034  0.042  0.013  2.348  1.391 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.291  0.048  0.061  0.017  2.417  1.811 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.364  0.108  0.147  0.032  2.652  3.388 × 10^{4}
100. GeV 1.001 × 10^{5} 2.387  0.140  0.194  0.040  2.762  4.127 × 10^{4}
140. GeV 1.401 × 10^{5} 2.421  0.206  0.289  0.056  2.972  5.522 × 10^{4}
200. GeV 2.001 × 10^{5} 2.457  0.310  0.440  0.079  3.286  7.441 × 10^{4}
300. GeV 3.001 × 10^{5} 2.497  0.487  0.697  0.119  3.800  1.027 × 10^{5}
400. GeV 4.001 × 10^{5} 2.525  0.671  0.965  0.158  4.320  1.274 × 10^{5}
552. GeV 5.519 × 10^{5} 2.557  0.957  1.382  0.219  5.115 Muon critical energy
800. GeV 8.001 × 10^{5} 2.595  1.432  2.067  0.320  6.415  2.029 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.617  1.825  2.632  0.402  7.476  2.317 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.651  2.613  3.761  0.570  9.595  2.788 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.688  3.821  5.486  0.824  12.821  3.328 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.731  5.843  8.355  1.262  18.191  3.979 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.761  7.895  11.258  1.707  23.623  4.460 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.836  16.187  22.941  3.557  45.522  5.659 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.861  20.373  28.819  4.508  56.562  6.052 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.899  28.730  40.538  6.465  78.633  6.650 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.939  41.358  58.202  9.468 111.968  7.286 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.986  62.356  87.604  14.672 167.619  8.011 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.020  83.442 117.091  20.007 223.561  8.526 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.104 167.987 235.128  42.342 448.562  9.764 × 10^{5}
100. TeV 1.000 × 10^{8} 3.131 210.360 294.210  53.900 561.602  1.016 × 10^{6}