Muons in palladium (Pd)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
46 (Pd) 106.42(1)  12.020  470.0 0.24178 2.7239 0.0563 3.0555 4.9358  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.682  4.682  1.216 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.702  3.702  2.186 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.926  2.926  4.029 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.295  2.295  7.940 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.972  1.972  1.267 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.500  1.501  3.664 × 10^{1}
100. MeV 1.764 × 10^{2} 1.417  1.417  5.039 × 10^{1}
140. MeV 2.218 × 10^{2} 1.335  1.335  7.961 × 10^{1}
200. MeV 2.868 × 10^{2} 1.295  1.295  1.254 × 10^{2}
253. MeV 3.431 × 10^{2} 1.289  1.289 Minimum ionization
300. MeV 3.917 × 10^{2} 1.292  0.000  0.000  1.292  2.029 × 10^{2}
400. MeV 4.945 × 10^{2} 1.309  0.000  0.000  1.310  2.798 × 10^{2}
800. MeV 8.995 × 10^{2} 1.392  0.001  0.000  1.393  5.756 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.425  0.001  0.000  1.427  7.174 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.478  0.002  0.000  0.001  1.481  9.924 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.535  0.003  0.001  0.001  1.540  1.389 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.600  0.005  0.003  0.001  1.609  2.023 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.645  0.007  0.005  0.002  1.658  2.635 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.746  0.016  0.016  0.003  1.782  4.953 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.776  0.022  0.022  0.004  1.824  6.062 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.819  0.033  0.036  0.005  1.894  8.212 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.862  0.051  0.059  0.008  1.981  1.131 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.908  0.084  0.103  0.011  2.106  1.620 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.938  0.118  0.150  0.015  2.222  2.082 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.005  0.267  0.360  0.029  2.662  3.724 × 10^{4}
100. GeV 1.001 × 10^{5} 2.026  0.345  0.473  0.037  2.881  4.446 × 10^{4}
140. GeV 1.401 × 10^{5} 2.056  0.507  0.706  0.051  3.321  5.738 × 10^{4}
200. GeV 2.001 × 10^{5} 2.087  0.760  1.075  0.072  3.995  7.384 × 10^{4}
218. GeV 2.178 × 10^{5} 2.095  0.835  1.182  0.079  4.191 Muon critical energy
300. GeV 3.001 × 10^{5} 2.123  1.192  1.692  0.108  5.116  9.591 × 10^{4}
400. GeV 4.001 × 10^{5} 2.149  1.639  2.331  0.145  6.264  1.136 × 10^{5}
800. GeV 8.001 × 10^{5} 2.211  3.484  4.952  0.292  10.940  1.613 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.231  4.432  6.293  0.367  13.324  1.778 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.261  6.333  8.969  0.520  18.085  2.035 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.294  9.242  13.053  0.752  25.343  2.314 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.332  14.099  19.840  1.150  37.423  2.637 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.359  19.022  26.700  1.554  49.637  2.868 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.427  38.875  54.277  3.230  98.811  3.428 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.449  48.881  68.141  4.091 123.563  3.609 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.482  68.839  95.802  5.858 172.982  3.881 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.518  98.956 137.472  8.566 247.514  4.170 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.560 149.094 206.805  13.246 371.707  4.497 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.591 199.416 276.306  18.037 496.350  4.729 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.665 401.021 554.502  38.045 996.234  5.287 × 10^{5}
100. TeV 1.000 × 10^{8} 2.690 502.000 693.730  48.380 1246.801  5.466 × 10^{5}