Muons in oxygen gas (O_{2})

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
8 (O)  15.999(3) 1.332 × 10^{−3} 95.0 0.11778 3.2913 1.7541 4.3213 10.7004 0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.951  6.951  7.977 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.429  5.430  1.456 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.246  4.246  2.720 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.298  3.298  5.429 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.818  2.819  8.731 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.120  2.120  2.561 × 10^{1}
100. MeV 1.764 × 10^{2} 1.995  1.995  3.536 × 10^{1}
140. MeV 2.218 × 10^{2} 1.873  1.873  5.615 × 10^{1}
200. MeV 2.868 × 10^{2} 1.812  1.812  8.884 × 10^{1}
256. MeV 3.462 × 10^{2} 1.801  0.000  1.801 Minimum ionization
300. MeV 3.917 × 10^{2} 1.805  0.000  1.805  1.443 × 10^{2}
400. MeV 4.945 × 10^{2} 1.830  0.000  1.831  1.993 × 10^{2}
800. MeV 8.995 × 10^{2} 1.955  0.000  0.000  1.956  4.105 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.007  0.000  0.000  2.008  5.114 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.093  0.000  0.000  0.001  2.094  7.063 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.189  0.001  0.000  0.001  2.191  9.861 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.302  0.001  0.001  0.001  2.306  1.430 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.384  0.002  0.001  0.002  2.389  1.856 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.567  0.004  0.004  0.004  2.578  3.458 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.617  0.005  0.005  0.005  2.632  4.225 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.687  0.008  0.008  0.006  2.710  5.722 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.757  0.012  0.014  0.009  2.792  7.901 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.829  0.020  0.024  0.013  2.887  1.142 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.876  0.028  0.036  0.017  2.958  1.484 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.977  0.064  0.087  0.034  3.163  2.789 × 10^{4}
100. GeV 1.001 × 10^{5} 3.007  0.084  0.114  0.042  3.247  3.413 × 10^{4}
140. GeV 1.401 × 10^{5} 3.050  0.123  0.171  0.058  3.403  4.616 × 10^{4}
200. GeV 2.001 × 10^{5} 3.092  0.185  0.262  0.082  3.623  6.324 × 10^{4}
300. GeV 3.001 × 10^{5} 3.139  0.292  0.416  0.123  3.971  8.959 × 10^{4}
400. GeV 4.001 × 10^{5} 3.170  0.403  0.577  0.165  4.315  1.137 × 10^{5}
800. GeV 8.001 × 10^{5} 3.245  0.863  1.244  0.333  5.684  1.943 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.268  1.101  1.588  0.418  6.375  2.275 × 10^{5}
1.05 TeV 1.050 × 10^{6} 3.274  1.160  1.673  0.440  6.547 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.304  1.579  2.273  0.593  7.749  2.843 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.342  2.313  3.322  0.858  9.836  3.529 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.386  3.544  5.068  1.314  13.312  4.400 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.417  4.794  6.837  1.779  16.828  5.066 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.495  9.855  13.962  3.711  31.023  6.791 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.520  12.412  17.550  4.706  38.189  7.371 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.559  17.515  24.700  6.755  52.529  8.260 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.601  25.230  35.482  9.902  74.216  9.217 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.650  38.075  53.425  15.361 110.511  1.031 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.685  50.983  71.424  20.963 147.055  1.110 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.771 102.749 143.480  44.451 294.452  1.298 × 10^{6}
100. TeV 1.000 × 10^{8} 3.799 128.700 179.550  56.620 368.670  1.359 × 10^{6}