Muons in osmium (Os)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
76 (Os) 190.23(3)  22.570  746.0 0.12751 2.9608 0.0891 3.5414 5.3083  0.10
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.946  3.946  1.468 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.144  3.144  2.614 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.502  2.502  4.775 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.975  1.975  9.331 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.704  1.704  1.481 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.306  1.306  4.242 × 10^{1}
100. MeV 1.764 × 10^{2} 1.236  1.236  5.820 × 10^{1}
140. MeV 2.218 × 10^{2} 1.168  1.168  9.164 × 10^{1}
200. MeV 2.868 × 10^{2} 1.136  1.136  1.439 × 10^{2}
243. MeV 3.325 × 10^{2} 1.132  0.000  1.132 Minimum ionization
300. MeV 3.917 × 10^{2} 1.137  0.000  0.000  1.137  2.321 × 10^{2}
400. MeV 4.945 × 10^{2} 1.155  0.000  0.000  1.155  3.194 × 10^{2}
800. MeV 8.995 × 10^{2} 1.233  0.001  0.000  1.235  6.539 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.265  0.001  0.000  1.267  8.137 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.315  0.002  0.001  1.318  1.123 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.369  0.004  0.001  0.001  1.374  1.568 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.430  0.007  0.003  0.001  1.441  2.278 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.472  0.010  0.006  0.002  1.490  2.960 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.568  0.024  0.021  0.003  1.616  5.528 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.596  0.031  0.030  0.004  1.662  6.747 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.638  0.048  0.049  0.005  1.741  9.097 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.679  0.074  0.080  0.007  1.842  1.245 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.723  0.122  0.141  0.011  1.998  1.765 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.752  0.172  0.208  0.014  2.148  2.248 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.817  0.390  0.503  0.028  2.739  3.893 × 10^{4}
100. GeV 1.001 × 10^{5} 1.837  0.505  0.662  0.035  3.039  4.586 × 10^{4}
140. GeV 1.401 × 10^{5} 1.866  0.741  0.989  0.048  3.645  5.787 × 10^{4}
146. GeV 1.463 × 10^{5} 1.869  0.778  1.041  0.050  3.740 Muon critical energy
200. GeV 2.001 × 10^{5} 1.895  1.110  1.507  0.069  4.582  7.253 × 10^{4}
300. GeV 3.001 × 10^{5} 1.929  1.740  2.372  0.103  6.145  9.132 × 10^{4}
400. GeV 4.001 × 10^{5} 1.952  2.392  3.268  0.138  7.751  1.058 × 10^{5}
800. GeV 8.001 × 10^{5} 2.009  5.079  6.942  0.278  14.309  1.432 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.028  6.458  8.821  0.349  17.657  1.558 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.056  9.222  12.568  0.494  24.342  1.750 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.087  13.447  18.285  0.715  34.535  1.956 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.122  20.498  27.785  1.093  51.499  2.192 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.147  27.640  37.384  1.476  68.649  2.359 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.209  56.422  75.967  3.065 137.665  2.763 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.229  70.920  95.359  3.881 172.391  2.892 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.260  99.837 134.054  5.554 241.708  3.087 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.294 143.456 192.342  8.118 346.212  3.293 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.333 216.072 289.314  12.545 520.265  3.528 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.361 288.936 386.509  17.074 694.882  3.693 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.429 580.787 775.554  35.974 1394.746  4.091 × 10^{5}
100. TeV 1.000 × 10^{8} 2.452 726.940 970.250  45.730 1745.374  4.219 × 10^{5}