Muons in nitrogen gas (N_{2})

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
7 (N)  14.007(2) 1.165 × 10^{−3} 82.0 0.15349 3.2125 1.7378 4.1323 10.5400 0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.084  7.084  7.814 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.530  5.530  1.427 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.321  4.321  2.669 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.354  3.354  5.333 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.865  2.865  8.580 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.152  2.152  2.520 × 10^{1}
100. MeV 1.764 × 10^{2} 2.025  2.025  3.481 × 10^{1}
140. MeV 2.218 × 10^{2} 1.900  1.900  5.529 × 10^{1}
200. MeV 2.868 × 10^{2} 1.837  1.837  8.753 × 10^{1}
257. MeV 3.471 × 10^{2} 1.825  0.000  1.825 Minimum ionization
300. MeV 3.917 × 10^{2} 1.829  0.000  1.829  1.422 × 10^{2}
400. MeV 4.945 × 10^{2} 1.853  0.000  1.853  1.966 × 10^{2}
800. MeV 8.995 × 10^{2} 1.977  0.000  0.000  1.977  4.054 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.029  0.000  0.000  2.030  5.052 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.114  0.000  0.001  2.116  6.980 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.211  0.001  0.000  0.001  2.212  9.750 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.324  0.001  0.001  0.001  2.327  1.415 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.405  0.001  0.001  0.002  2.410  1.837 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.586  0.003  0.003  0.004  2.597  3.426 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.636  0.005  0.005  0.005  2.650  4.188 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.706  0.007  0.007  0.007  2.727  5.675 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.775  0.011  0.012  0.009  2.808  7.841 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.846  0.018  0.022  0.013  2.899  1.134 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.892  0.025  0.032  0.018  2.967  1.475 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.992  0.057  0.077  0.034  3.161  2.778 × 10^{4}
100. GeV 1.001 × 10^{5} 3.021  0.074  0.102  0.042  3.240  3.403 × 10^{4}
140. GeV 1.401 × 10^{5} 3.063  0.110  0.153  0.059  3.384  4.611 × 10^{4}
200. GeV 2.001 × 10^{5} 3.104  0.165  0.234  0.083  3.587  6.332 × 10^{4}
300. GeV 3.001 × 10^{5} 3.150  0.261  0.372  0.124  3.907  9.002 × 10^{4}
400. GeV 4.001 × 10^{5} 3.181  0.360  0.515  0.166  4.222  1.146 × 10^{5}
800. GeV 8.001 × 10^{5} 3.254  0.772  1.113  0.335  5.474  1.976 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.277  0.985  1.422  0.421  6.105  2.322 × 10^{5}
1.15 TeV 1.154 × 10^{6} 3.292  1.149  1.655  0.488  6.585 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.313  1.414  2.036  0.597  7.359  2.918 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.351  2.073  2.977  0.864  9.265  3.643 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.394  3.176  4.543  1.324  12.439  4.572 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.426  4.299  6.132  1.792  15.649  5.287 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.503  8.841  12.530  3.740  28.615  7.150 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.529  11.138  15.752  4.743  35.162  7.779 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.568  15.720  22.172  6.809  48.270  8.746 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.610  22.650  31.856  9.982  68.098  9.788 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.658  34.187  47.969  15.491 101.305  1.098 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.693  45.784  64.133  21.144 134.754  1.184 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.779  92.292 128.845  44.860 269.777  1.390 × 10^{6}
100. TeV 1.000 × 10^{8} 3.808 115.610 161.240  57.150 337.808  1.456 × 10^{6}